From e8eb61fc11311630b7c575ae45690798aa33c10a Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Sat, 27 Mar 2010 22:27:40 -0500
Subject: runitscripts: lirc/run Nothing but whitespace changes. This file was
 a mix of tabs and spaces Converted everything to spaces

---
 .../runit-scripts/runitscripts/services/lircd/run  | 69 +++++++++++-----------
 1 file changed, 36 insertions(+), 33 deletions(-)

diff --git a/abs/core-testing/runit-scripts/runitscripts/services/lircd/run b/abs/core-testing/runit-scripts/runitscripts/services/lircd/run
index 07ec214..014563c 100755
--- a/abs/core-testing/runit-scripts/runitscripts/services/lircd/run
+++ b/abs/core-testing/runit-scripts/runitscripts/services/lircd/run
@@ -6,8 +6,6 @@ export TERM=linux
 . /etc/rc.conf
 . /etc/rc.d/functions
 
-#since what we do may not be enough
-#if your one of those people, this is where you place your stuff
 
 LOG=/tmp/lirc.log
 
@@ -16,12 +14,17 @@ then
     rm -f $LOG
 fi
 
+#since what we do may not be enough
+#if your one of those people, this is where you place your stuff
+#This means place your lirc stuff in /etc/runit/lirc.sh.  
+#Anything in that file will be used and the rest of this file is ignored
+
 if [ -f /etc/runit/lirc.sh ]
 then
     #program must not terminate.
 
     stat_runit "Starting lirc"
-	
+    
     /etc/runit/lirc.sh
 else
     . /etc/systemconfig
@@ -55,8 +58,8 @@ else
     then
         #/dev/ttyS0 (COM1), port 0x3f8, irq 4
         #/dev/ttyS1 (COM2), port 0x2f8, irq 3
-    	#/dev/ttyS2 (COM3), port 0x3e8, irq 4
-    	#/dev/ttyS3 (COM4), port 0x2e8, irq 3
+        #/dev/ttyS2 (COM3), port 0x3e8, irq 4
+        #/dev/ttyS3 (COM4), port 0x2e8, irq 3
 
         case $serial_port in
         ttyS0)
@@ -73,9 +76,9 @@ else
                ;;
         esac
         /usr/bin/setserial /dev/$serial_port uart none
-	sleep 0.5
+        sleep 0.5
         /sbin/modprobe lirc_serial $FLAGS
-	sleep 0.5
+        sleep 0.5
     fi
 
     dvico_detect
@@ -83,15 +86,15 @@ else
     if [ x$HostBlasterType = xCommandIR -o x$ReceiverType = xCommandIR ]
     then
         CMD="/usr/sbin/lircd -r -n  --driver=commandir"
-	printhl "	Using commandir"
+        printhl "   Using commandir"
         $CMD >>$LOG 2>>$LOG
-#echo $CMD
+        #echo $CMD
     elif [  x$HostBlasterType = xiguanaIR-usb -o x$ReceiverType = xiguanaIR-usb ]
     then
-	sv start igdaemon
+        sv start igdaemon
         CMD="/usr/sbin/lircd -r -n  --driver=iguanaIR"
-	printhl "       Using iguanaIR usb"
-#echo $CMD
+        printhl "       Using iguanaIR usb"
+        #echo $CMD
         $CMD >>$LOG 2>>$LOG
     else
         LASTCMD=""
@@ -99,40 +102,40 @@ else
         for i in `seq 1 $num_lirc`
         do
             CMD="/usr/sbin/lircd -r -d /dev/lirc$i --output=/dev/lircd$i --pidfile=/var/run/lircd$i.pid --listen=876$i"
-	    printhl "	Device $i"
-#echo $CMD
+            printhl "   Device $i"
+            #echo $CMD
             $CMD >>$LOG 2>>$LOG
             LASTCMD="--connect=localhost:876$i   $LASTCMD    "
         done
 
-	if [ $RunDvico = "true" ]
-	then
-	    if [ x$Remotetype = "xdvico" ]
+        if [ $RunDvico = "true" ]
+        then
+            if [ x$Remotetype = "xdvico" ]
             then
                 LCMD="/usr/sbin/lircd -r -n -d /dev/usb/dvicoIR --driver=dvico  --output /dev/lircd"
             else
                 LCMD="/usr/sbin/lircd -r -n -d /dev/input/irremote --driver=devinput  --output /dev/lircd"
             fi
 
-	    if [ $num_lirc -lt 0 ]
-	    then
-		# Only run Dvico
-		printhl "   Device $Remotetype"
-#echo $LCMD
-            	exec $LCMD >>$LOG 2>>$LOG
-	    elif [ $num_lirc -gt -1  ]
-	    then
+            if [ $num_lirc -lt 0 ]
+            then
+                # Only run Dvico
+                printhl "   Device $Remotetype"
+                #echo $LCMD
+                exec $LCMD >>$LOG 2>>$LOG
+            elif [ $num_lirc -gt -1  ]
+            then
                 i=$((i+1))
                 CMD="$LCMD --output=/dev/lircd$i --pidfile=/var/run/lircd$i.pid --listen=876$i"
                 $CMD >> $LOG
                 LASTCMD="--connect=localhost:876$i   $LASTCMD    "
-	        printhl "	Device Dvico"
-		/usr/sbin/lircd -r -n -d /dev/lirc0 --output /dev/lircd  $LASTCMD  >>$LOG 2>>$LOG
-	    fi
-	else
-	    LCMD="/usr/sbin/lircd -r -n -d /dev/lirc0 --output /dev/lircd  $LASTCMD"
-#echo $LCMD
-     	    exec $LCMD >>$LOG 2>>$LOG
-	fi
+                printhl "   Device Dvico"
+                /usr/sbin/lircd -r -n -d /dev/lirc0 --output /dev/lircd  $LASTCMD  >>$LOG 2>>$LOG
+            fi
+        else
+            LCMD="/usr/sbin/lircd -r -n -d /dev/lirc0 --output /dev/lircd  $LASTCMD"
+            #echo $LCMD
+            exec $LCMD >>$LOG 2>>$LOG
+        fi
     fi
 fi
-- 
cgit v0.12

