From 2dc0e972f1779dfb3e7759cb01b7deeacd99acbe Mon Sep 17 00:00:00 2001
From: Michael Hanson <hansonorders@verison.net>
Date: Fri, 16 Jul 2010 21:32:56 +0000
Subject: cpufreqd: update to 2.4.2 ref 647

---
 abs/extra-testing/cpufreqd/PKGBUILD | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

diff --git a/abs/extra-testing/cpufreqd/PKGBUILD b/abs/extra-testing/cpufreqd/PKGBUILD
index a727e28..fd6d544 100644
--- a/abs/extra-testing/cpufreqd/PKGBUILD
+++ b/abs/extra-testing/cpufreqd/PKGBUILD
@@ -4,8 +4,8 @@
 # Contributor: Manolis Tzanidakis <manolis@archlinux.org>
 
 pkgname=cpufreqd
-pkgver=2.3.4
-pkgrel=2
+pkgver=2.4.2
+pkgrel=1
 pkgdesc="A small daemon to adjust cpu speed (and indeed voltage)"
 arch=('i686' 'x86_64')
 url="http://sourceforge.net/projects/cpufreqd"
@@ -16,8 +16,6 @@ backup=(etc/cpufreqd.conf)
 options=('!libtool')
 source=(http://downloads.sourceforge.net/$pkgname/$pkgname-$pkgver.tar.bz2
 	'cpufreqd')
-md5sums=('f4193f688305566a8422dd3989667668'
-	'ae7b0ec1e8e9f9e7f05fb83749af4ed4')
 
 build() {
   cd $srcdir/$pkgname-$pkgver
@@ -28,3 +26,5 @@ build() {
 
   install -D -m 755 $srcdir/cpufreqd $pkgdir/etc/rc.d/cpufreqd || return 1
 }
+md5sums=('2ca80a77849c9a69b81e27c1843c97f5'
+         'ae7b0ec1e8e9f9e7f05fb83749af4ed4')
-- 
cgit v0.12

