From 8df17b59ad2a4f92633c25406d495586a1c4ec06 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Tue, 30 Mar 2010 21:28:45 -0500
Subject: lighttpd: added default 404 page

---
 abs/core-testing/lighttpd/PKGBUILD      | 8 +++++++-
 abs/core-testing/lighttpd/__changelog   | 2 +-
 abs/core-testing/lighttpd/lighttpd.conf | 2 +-
 3 files changed, 9 insertions(+), 3 deletions(-)

diff --git a/abs/core-testing/lighttpd/PKGBUILD b/abs/core-testing/lighttpd/PKGBUILD
index bbb0a39..eea4367 100644
--- a/abs/core-testing/lighttpd/PKGBUILD
+++ b/abs/core-testing/lighttpd/PKGBUILD
@@ -3,7 +3,7 @@
 
 pkgname=lighttpd
 pkgver=1.4.26
-pkgrel=9
+pkgrel=11
 pkgdesc='a secure, fast, compliant and very flexible web-server'
 license=('custom')
 arch=('i686' 'x86_64')
@@ -75,3 +75,9 @@ md5sums=('a682c8efce47a2f4263a247ba0813c9b'
          '07b8459b54fb2e70280064c2a275b176'
          'c6e361131000ceec085f40b310ef4a2c'
          '84c884b8dadd724afe2bc6529e9d4485')
+md5sums=('a682c8efce47a2f4263a247ba0813c9b'
+         'bd690eee0d9e51857448770a151023b0'
+         '857e174643fd7761a2f0d8431a679f6c'
+         '11fbec7ff7ca1b0d5575445681e8f60e'
+         'c6e361131000ceec085f40b310ef4a2c'
+         '84c884b8dadd724afe2bc6529e9d4485')
diff --git a/abs/core-testing/lighttpd/__changelog b/abs/core-testing/lighttpd/__changelog
index 63bc373..5c0a14f 100644
--- a/abs/core-testing/lighttpd/__changelog
+++ b/abs/core-testing/lighttpd/__changelog
@@ -6,4 +6,4 @@ upgraded to 1.4.26 to address http://linhes.org/flyspray/index.php?do=details&ta
 Added -e 's|"^/mythweb|"^/{1,2}mythweb|' \ to the sed command to work around lighttpd no longer honoring // in a url and/or to work around mythweb producing url's with a // for streaming and downloading.
 
 changed lightttpd.conf to user perl for .cgi (needed for monx)_
-
+added 404 page
diff --git a/abs/core-testing/lighttpd/lighttpd.conf b/abs/core-testing/lighttpd/lighttpd.conf
index af7d134..f437484 100644
--- a/abs/core-testing/lighttpd/lighttpd.conf
+++ b/abs/core-testing/lighttpd/lighttpd.conf
@@ -145,7 +145,7 @@ static-file.exclude-extensions = ( ".php", ".pl", ".fcgi" )
 #server.bind                = "127.0.0.1"
 
 ## error-handler for status 404
-#server.error-handler-404   = "/error-handler.html"
+server.error-handler-404   = "/404.html"
 #server.error-handler-404   = "/error-handler.php"
 
 ## to help the rc.scripts
-- 
cgit v0.12

