From 0085037941d0bd7c3fb91c7f39651f1f1ddbad25 Mon Sep 17 00:00:00 2001
From: Cecil Hugh Watson <knoppmyth@gmail.com>
Date: Fri, 28 May 2010 19:48:31 -0700
Subject: LinHES-config:bumped for public testing ISO.

---
 abs/core-testing/LinHES-config/LinHES-release | 2 +-
 abs/core-testing/LinHES-config/README         | 4 ++--
 2 files changed, 3 insertions(+), 3 deletions(-)

diff --git a/abs/core-testing/LinHES-config/LinHES-release b/abs/core-testing/LinHES-config/LinHES-release
index 0d24981..8aec91b 100644
--- a/abs/core-testing/LinHES-config/LinHES-release
+++ b/abs/core-testing/LinHES-config/LinHES-release
@@ -1 +1 @@
-LinHES R6.02.03 (Neighbors)
+LinHES R6.02.04 (Neighbors)
diff --git a/abs/core-testing/LinHES-config/README b/abs/core-testing/LinHES-config/README
index 447678a..e045f2c 100644
--- a/abs/core-testing/LinHES-config/README
+++ b/abs/core-testing/LinHES-config/README
@@ -1,9 +1,9 @@
 Thanks for choosing LinHES!  At the moment, LinHES is compiled for i686. 
-If you have an i586 class system, LinHES won't work for you.  I've not seen a great request for i586.  If you want it, you have to drum up support for it.  The PVR-350 TV out isn't supported at this time.  I have to determine if it works with MythTV 0.22 first.
+If you have an i586 class system, LinHES won't work for you.  I've not seen a great request for i586.  If you want it, you have to drum up support for it. 
 
 Support for LinHES can be obtained at:
 http://linhes.org
 irc.freenode.net #linhes
  
 Bugs can be reported at:
-http://linhes.org/flyspray
+http://linhes.org/bugs
-- 
cgit v0.12

