From 6ab0e85152731b2a0209e58016404cb605814921 Mon Sep 17 00:00:00 2001
From: Britney Fransen <brfransen@gmail.com>
Date: Tue, 6 Apr 2010 15:40:00 -0500
Subject: linhes-scripts: Add mythwelcome-config.py script

---
 abs/core-testing/linhes-scripts/PKGBUILD           | 32 +++++++++++++++++++++-
 .../linhes-scripts/mythwelcome-config.py           | 27 ++++++++++++++++++
 2 files changed, 58 insertions(+), 1 deletion(-)
 create mode 100755 abs/core-testing/linhes-scripts/mythwelcome-config.py

diff --git a/abs/core-testing/linhes-scripts/PKGBUILD b/abs/core-testing/linhes-scripts/PKGBUILD
index a9d6f5b..6c9c085 100644
--- a/abs/core-testing/linhes-scripts/PKGBUILD
+++ b/abs/core-testing/linhes-scripts/PKGBUILD
@@ -3,7 +3,7 @@
 
 pkgname=linhes-scripts
 pkgver=1
-pkgrel=64
+pkgrel=65
 pkgdesc="Various scripts that help to make LinHES, LinHES."
 arch=('i686' 'x86_64')
 license=('GPL2')
@@ -24,6 +24,7 @@ pause-mythcommflag.sh
 myth2x264
 770-wrapper.sh
 mythwelcome-set-alarm.sh
+mythwelcome-config.py
 pause_mythcommflag
 limit-mythcommflag.sh
 vdpau-detector
@@ -80,3 +81,32 @@ md5sums=('f56985b2d602e11dc1e10d3e7848b2a5'
          'd7c7914225ec86bf3ea46104a364f977'
          '25c1baeb97a49656456ae33f7e7a9f06'
          '2fb25aef03ffd1282414d8cca3df7056')
+md5sums=('f56985b2d602e11dc1e10d3e7848b2a5'
+         '623b6e9ba6cc4a19771005e750f337a7'
+         '9ae2cd7a0c42d57ad8b5f515d7d60196'
+         '1274bad3fb7296f00acd2d44804bad14'
+         'b4f858834ea92418208ab496ca39ad32'
+         '6b6e7d34a4bda6d608d150039adefd07'
+         '3fe554dbbf7d09e1f9925032ba888bf5'
+         '18263972b6326e140bbef0bb7dfa2da9'
+         '410795ef9039e4c6c0484e706ecfd567'
+         '0750d7c65109d12aa536f312a38410d1'
+         'ac2a4a6b4100f4d7bfb9ecd9356c8c6e'
+         'd2b475821f902c5e081e7da43a35e6ac'
+         '95c092f67036a361ef7a57436f44332e'
+         'a87e7394bfb3fcc5c2419a2f9ae9b9aa'
+         '3b776bbff68906ddc2f62b7e0dde3fe4'
+         '15f3143d2b1369da431e4268029aba40'
+         '3d0adf26280cde55a0c47188fff34826'
+         '93aaa2940e33ec9ebb305b839ac46a3e'
+         '27a8b3680f3c631a582064fd26ab8746'
+         'b527b01d119d3bc33b8fa69bdf1082bb'
+         'c537c44156d8404016cc4b405b092d45'
+         '4e66f302a77f1a857476e7f289d0c157'
+         'be324dba44ae96676973a74421944853'
+         'c9dc0dd07369622879a000247ac55074'
+         '65629302a4d2c3adf88cdf0ebc10d493'
+         'ea5492d4dab8271db20cb84416c001dc'
+         'd7c7914225ec86bf3ea46104a364f977'
+         '25c1baeb97a49656456ae33f7e7a9f06'
+         '2fb25aef03ffd1282414d8cca3df7056')
diff --git a/abs/core-testing/linhes-scripts/mythwelcome-config.py b/abs/core-testing/linhes-scripts/mythwelcome-config.py
new file mode 100755
index 0000000..c7bf10b
--- /dev/null
+++ b/abs/core-testing/linhes-scripts/mythwelcome-config.py
@@ -0,0 +1,27 @@
+#!/usr/bin/env python
+
+# This script will configure the myth db to allow MythWelcome to wake and shutdown the system.
+
+from socket import gethostname
+from MythTV import MythDB
+mythdb = MythDB()
+localhostname = gethostname()
+
+# mythwelcome --setup
+mythdb.settings[localhostname].MythShutdownNvramCmd = u'sudo sh -c \"/usr/LH/bin/mythwelcome-set-alarm.sh $time\"'
+mythdb.settings[localhostname].MythShutdownWakeupTimeFmt = u'time_t'
+mythdb.settings[localhostname].MythShutdownNvramRestartCmd = u''
+mythdb.settings[localhostname].MythShutdownReboot = u'sudo /sbin/reboot'
+mythdb.settings[localhostname].MythShutdownPowerOff = u'sudo /sbin/poweroff'
+mythdb.settings[localhostname].MythShutdownXTermCmd = u'xterm'
+mythdb.settings[localhostname].MythWelcomeStartFECmd = u'/usr/LH/bin/mythfrontend-start'
+
+
+# mythtv-setup Shutdown/Wakeup options
+if mythdb.settings[localhostname].idleTimeoutSecs == u'0':
+    mythdb.settings[localhostname].idleTimeoutSecs = u'40'
+
+mythdb.settings.NULL.WakeupTimeFormat = u'yyyy-MM-ddThh:mm:ss'
+mythdb.settings.NULL.SetWakeuptimeCommand = u'/usr/bin/mythshutdown --setwakeup $time'
+mythdb.settings.NULL.ServerHaltCommand = u'/usr/bin/mythshutdown --shutdown'
+mythdb.settings.NULL.preSDWUCheckCommand = u'/usr/bin/mythshutdown --check'
-- 
cgit v0.12

