From 18d3e283a657dc6b0d619f24a88e74f4c91b8a5f Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Mon, 29 Mar 2010 18:39:39 -0500
Subject: Linhes-config: mv_ir  add support for hdhr.  For now hardcodes the
 port  to 5000 when setting the target for hdhr. closes #622

---
 abs/core-testing/LinHES-config/PKGBUILD | 72 ++++++++++++++++++++++++++++++++-
 abs/core-testing/LinHES-config/mv_ir.py | 15 +++++--
 2 files changed, 83 insertions(+), 4 deletions(-)

diff --git a/abs/core-testing/LinHES-config/PKGBUILD b/abs/core-testing/LinHES-config/PKGBUILD
index ce6d7d8..37d5f0a 100644
--- a/abs/core-testing/LinHES-config/PKGBUILD
+++ b/abs/core-testing/LinHES-config/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=LinHES-config
 pkgver=2.1
-pkgrel=32
+pkgrel=34
 conflicts=(MythVantage-config MythVantage-config-dev LinHES-config-dev LinHes-config )
 pkgdesc="Install and configure your system"
 depends=('bc' 'libstatgrab'  'mysql-python' 'expect' 'curl' 'dnsutils' 'parted'
@@ -136,3 +136,73 @@ md5sums=('297441b8d85820698c19e7c0ad5a3dfe'
          'cf35353141b70145f3ee8b0bd852c9f1'
          'cf60e7ba4cf3467bb5539d5c51da61b6'
          'a63ff9ef5250965aeabc74bfa8e43981')
+md5sums=('297441b8d85820698c19e7c0ad5a3dfe'
+         '1a4694fcd694b362c339bda781ed0f3e'
+         'e36da536dd651ef182e7642337889e77'
+         '3baa23764e1b6bcb2d66d7d859096940'
+         'd7a8cd4a0060399ae22e69f74e04eb07'
+         '7a45287a07145fde5aa664583d4f6fba'
+         'f88d2fb88339a4bf8ec9217a3fbcdef7'
+         '8ac1cfd2eca0f641737da0d0aca416a7'
+         'd8a4a1699e04eed9ee69d58616069f33'
+         '4620f6f498ef4523398635cb0bd59425'
+         '06188493e5ed79cb501d3c5694dee8ca'
+         'e459ed069317bccb20351f037a9df3d2'
+         '26ee0932243b79484b37eb8f6cf04cd4'
+         '6aff504ed5e860adc1b7317cd0780900'
+         '55fccb1da0417a896b724f7cfc32dd5a'
+         'ab2aa42c2947148c2b1cac0ade6d1d55'
+         'd429b59d3cfb37b0624c6a4a71a7c2c0'
+         'a225143e3df6f56d451c2875e54ddbae'
+         '687555968d4ca688d8f95c8f13e1d8d4'
+         '3d1e4a119f38cff0498bf8a67e94e4b3'
+         '37401edf67296d3a4467ad178958d177'
+         'ee7c8e1f025ce1527ecfffabafb26806'
+         '41b03fb1e0a9d9ae7588e3b813212772'
+         'a9ffe72c3ede99d505fdc97572a7c256'
+         'df43bce1712320508d4eef8449c5d223'
+         '65d93f15ac85adf8299552581789a731'
+         '4badc3c664c55f87396a473e6c14d4bc'
+         'e2aa772fe0bf366e26eaaf663f9257bd'
+         'fe5e31b833cc6707209e9d656b6eb53c'
+         'd328d63eaa4252f3d4888476c79bbff6'
+         '23d0e12b7ca1cc6ea6b993c1d7ff20b9'
+         '88059ef8c4a2926bb6fde14d810e1336'
+         'cf35353141b70145f3ee8b0bd852c9f1'
+         'cf60e7ba4cf3467bb5539d5c51da61b6'
+         'a63ff9ef5250965aeabc74bfa8e43981')
+md5sums=('297441b8d85820698c19e7c0ad5a3dfe'
+         '1a4694fcd694b362c339bda781ed0f3e'
+         'e36da536dd651ef182e7642337889e77'
+         '3baa23764e1b6bcb2d66d7d859096940'
+         'd7a8cd4a0060399ae22e69f74e04eb07'
+         '7a45287a07145fde5aa664583d4f6fba'
+         'f88d2fb88339a4bf8ec9217a3fbcdef7'
+         '8ac1cfd2eca0f641737da0d0aca416a7'
+         'd8a4a1699e04eed9ee69d58616069f33'
+         '4620f6f498ef4523398635cb0bd59425'
+         '06188493e5ed79cb501d3c5694dee8ca'
+         'e459ed069317bccb20351f037a9df3d2'
+         '26ee0932243b79484b37eb8f6cf04cd4'
+         '6aff504ed5e860adc1b7317cd0780900'
+         '55fccb1da0417a896b724f7cfc32dd5a'
+         'ab2aa42c2947148c2b1cac0ade6d1d55'
+         'd429b59d3cfb37b0624c6a4a71a7c2c0'
+         'a225143e3df6f56d451c2875e54ddbae'
+         '687555968d4ca688d8f95c8f13e1d8d4'
+         '3d1e4a119f38cff0498bf8a67e94e4b3'
+         '37401edf67296d3a4467ad178958d177'
+         'ee7c8e1f025ce1527ecfffabafb26806'
+         '41b03fb1e0a9d9ae7588e3b813212772'
+         'a9ffe72c3ede99d505fdc97572a7c256'
+         'df43bce1712320508d4eef8449c5d223'
+         '65d93f15ac85adf8299552581789a731'
+         '4badc3c664c55f87396a473e6c14d4bc'
+         'e2aa772fe0bf366e26eaaf663f9257bd'
+         'fe5e31b833cc6707209e9d656b6eb53c'
+         'd328d63eaa4252f3d4888476c79bbff6'
+         '23d0e12b7ca1cc6ea6b993c1d7ff20b9'
+         '857a831e8627727306208f0e776b1b98'
+         'cf35353141b70145f3ee8b0bd852c9f1'
+         'cf60e7ba4cf3467bb5539d5c51da61b6'
+         'a63ff9ef5250965aeabc74bfa8e43981')
diff --git a/abs/core-testing/LinHES-config/mv_ir.py b/abs/core-testing/LinHES-config/mv_ir.py
index 3573ee3..a5e3f3b 100755
--- a/abs/core-testing/LinHES-config/mv_ir.py
+++ b/abs/core-testing/LinHES-config/mv_ir.py
@@ -113,7 +113,7 @@ def setup_ir_remote(Remotetype,templates):
         mv_common.add_service("lircd")
 
 
-def setup_ir_receiver(ReceiverType,TEMPLATES):
+def setup_ir_receiver(ReceiverType,TEMPLATES,HDHRlirc_device,myip):
     logging.info("    Configuring receiver %s", ReceiverType)
     if ReceiverType == "Serial":
         scrub_modules("/etc/modules.mythvantage","lirc")
@@ -153,6 +153,7 @@ def setup_ir_receiver(ReceiverType,TEMPLATES):
         mv_common.runcmd(cmd)
         mv_common.remove_service("igdaemon")
         mv_common.remove_service("tatir")
+
     elif ReceiverType == "iguanaIR-usb":
         scrub_modules("/etc/modules.mythvantage","lirc")
         mv_common.add_service("igdaemon")
@@ -162,6 +163,12 @@ def setup_ir_receiver(ReceiverType,TEMPLATES):
         scrub_modules("/etc/modules.mythvantage","lirc")
         mv_common.add_service("tatir")
         mv_common.remove_service("igdaemon")
+    elif ReceiverType == "SiliconDust_HDHR":
+        mv_common.remove_service("igdaemon")
+        mv_common.remove_service("tatir")
+        cmd = '''hdhomerun_config %s set /ir/target %s:5000 store''' %(HDHRlirc_device,myip)
+        print cmd
+        mv_common.runcmd(cmd)
 
     else:
         logging.debug("    didn't match receiver, using genric case")
@@ -308,9 +315,11 @@ def setup_ir(systemconfig, data_config):
 
         if systemconfig["ReceiverType"]:
             setup_ir_receiver(systemconfig["ReceiverType"],
-                              systemconfig["TEMPLATES"])
+                              systemconfig["TEMPLATES"],
+                              systemconfig["HDHRlirc_device"],
+                              systemconfig["mythip"])
         else:
-            setup_ir_receiver("unknown", systemconfig["TEMPLATES"])
+            setup_ir_receiver("unknown", systemconfig["TEMPLATES"],'','127.0.0.1')
         unload_all_lirc()
         setup_blaster_proto(HostBlasterType,
                             Hostnumblaster,
-- 
cgit v0.12

