From be3b8274ca7dfbccf3a27865d6e9cc50a70570cc Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Sat, 20 Mar 2010 23:18:09 -0500
Subject: local-website: change rrd error page to reflect this is linhes6 not
 knoppmyth 5.5 closes 650

---
 abs/core-testing/local-website/PKGBUILD              | 2 +-
 abs/core-testing/local-website/htdocs/rrd/index.html | 2 +-
 2 files changed, 2 insertions(+), 2 deletions(-)

diff --git a/abs/core-testing/local-website/PKGBUILD b/abs/core-testing/local-website/PKGBUILD
index 1f1faa9..5a84b2b 100644
--- a/abs/core-testing/local-website/PKGBUILD
+++ b/abs/core-testing/local-website/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=local-website
 pkgver=2
-pkgrel=15
+pkgrel=16
 pkgdesc="Contents of http://localhost"
 arch=(i686 x86_64)
 license=('GPL')
diff --git a/abs/core-testing/local-website/htdocs/rrd/index.html b/abs/core-testing/local-website/htdocs/rrd/index.html
index 5f595b2..c60692f 100644
--- a/abs/core-testing/local-website/htdocs/rrd/index.html
+++ b/abs/core-testing/local-website/htdocs/rrd/index.html
@@ -13,7 +13,7 @@
     <tbody>
       <tr>
 	<td style="vertical-align: top;">
-	  <p class="headerimage" align="center"><b>KnoppMyth R5.5</b></p>
+	  <p class="headerimage" align="center"><b>The Linux Home Entertainment System Release 6</b></p>
     <p align=center>
 <font size="+2">RRD Tool</font><br>
 <font size="+1">Is <font color="#CC0000">disabled</font>
-- 
cgit v0.12

