From f8070f560f719acc0c7d1759686bda75d3da02ac Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Fri, 26 Mar 2010 23:39:54 -0500
Subject: mythsmolt: upstream bugfix for exception when collecting tuner info
 closes #667

---
 abs/core-testing/mythtv/stable-0.22/mythsmolt/PKGBUILD | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

diff --git a/abs/core-testing/mythtv/stable-0.22/mythsmolt/PKGBUILD b/abs/core-testing/mythtv/stable-0.22/mythsmolt/PKGBUILD
index 8f0bd9e..e609048 100644
--- a/abs/core-testing/mythtv/stable-0.22/mythsmolt/PKGBUILD
+++ b/abs/core-testing/mythtv/stable-0.22/mythsmolt/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=mythsmolt
 pkgver=0.22
-pkgrel=11
+pkgrel=16
 pkgdesc="mythsmolt, a hardware profileing tool"
 arch=('i686' 'x86_64')
 url="http://www.mythvantage.com"
@@ -16,3 +16,5 @@ build() {
    make || return 1
    make INSTALL_ROOT=$startdir/pkg install
 }
+md5sums=('b8e9b79db0d8f428ba127c6e42577761')
+md5sums=('fdf68ec5c78827aefca6f09ad82296a4')
-- 
cgit v0.12

