From 10b9e6d826382b950763f0e969dd07793f412165 Mon Sep 17 00:00:00 2001
From: Greg Frost <gregfrost1@bigpond.com>
Date: Sat, 30 May 2009 10:25:40 +0930
Subject: lirc: added support for other mce remotes

---
 abs/core-testing/lirc/PKGBUILD           |  4 +-
 abs/core-testing/lirc/lirc_mod_mce.patch | 89 +++++++++++++++++++++++++++++++-
 2 files changed, 89 insertions(+), 4 deletions(-)

diff --git a/abs/core-testing/lirc/PKGBUILD b/abs/core-testing/lirc/PKGBUILD
index 285afcc..d8cfe29 100644
--- a/abs/core-testing/lirc/PKGBUILD
+++ b/abs/core-testing/lirc/PKGBUILD
@@ -3,7 +3,7 @@
 
 pkgname=lirc
 pkgver=0.8.5CVS
-pkgrel=10
+pkgrel=11
 _kernver=2.6.28-LinHES
 pkgdesc="Linux Infrared Remote Control kernel modules for stock arch kernel"
 arch=(i686 x86_64)
@@ -71,6 +71,6 @@ md5sums=('b96dae91b566143b3af433fa2714ec9a'
          '6f151eb4e81fc7776a06c9063e6ad9a5'
          '7eccd7826ab99e5cf1b9154171c8b927'
          '21ce358809105f005e888e3b138c59e6'
-         '5e6c3e8586ce7abdcbf881c1a4939d44'
+         'd299b696b007fc9b663a73cc1758a1ef'
          'f059f4030afc682c9539a03bf837c1cf'
          '4e698654cc44fc6c4163814acda5a7ee')
diff --git a/abs/core-testing/lirc/lirc_mod_mce.patch b/abs/core-testing/lirc/lirc_mod_mce.patch
index c794961..314f2d7 100644
--- a/abs/core-testing/lirc/lirc_mod_mce.patch
+++ b/abs/core-testing/lirc/lirc_mod_mce.patch
@@ -1,7 +1,92 @@
 diff -Naru lirc_mod_mce.orig/lirc_mod_mce.c lirc_mod_mce/lirc_mod_mce.c
 --- lirc_mod_mce.orig/lirc_mod_mce.c	2008-04-18 02:12:28.000000000 +0930
-+++ lirc_mod_mce/lirc_mod_mce.c	2009-05-11 22:10:39.000000000 +0930
-@@ -1108,7 +1108,7 @@
++++ lirc_mod_mce/lirc_mod_mce.c	2009-05-28 07:53:10.000000000 +0930
+@@ -171,17 +171,76 @@
+ #define VENDOR_TATUNG           0x1460
+ #define VENDOR_GATEWAY          0x107b
+ #define VENDOR_SHUTTLE          0x1308
++#define VENDOR_PHILIPS          0x0471
++#define VENDOR_SMK              0x0609
++#define VENDOR_TATUNG           0x1460
++#define VENDOR_GATEWAY          0x107b
++#define VENDOR_SHUTTLE          0x1308
++#define VENDOR_SHUTTLE2         0x051c
++#define VENDOR_MITSUMI          0x03ee
++#define VENDOR_TOPSEED          0x1784
++#define VENDOR_RICAVISION       0x179d
++#define VENDOR_ITRON            0x195d
++#define VENDOR_FIC              0x1509
++#define VENDOR_LG               0x043e
++#define VENDOR_MICROSOFT        0x045e
++#define VENDOR_FORMOSA          0x147a
++#define VENDOR_FINTEK           0x1934
+ #define VENDOR_PINNACLE         0x2304
+ 
+-
+ static struct usb_device_id usb_remote_table [] = {
+-    { USB_DEVICE(VENDOR_PHILIPS, 0x0815) },  /* Philips eHome Infrared Transciever */
+-    { USB_DEVICE(VENDOR_SMK, 0x031d) },      /* SMK/Toshiba G83C0004D410 */
+-    { USB_DEVICE(VENDOR_TATUNG, 0x9150) },   /* Tatung eHome Infrared Transceiver */
+-    { USB_DEVICE(VENDOR_SHUTTLE, 0xc001) },  /* Shuttle eHome Infrared Transceiver */
+-    { USB_DEVICE(VENDOR_GATEWAY, 0x3009) },  /* Gateway eHome Infrared Transceiver */
+-    { USB_DEVICE(VENDOR_PINNACLE, 0x0225) }, /* Pinnacle Remote USB RC6 */
+-    { }                                      /* Terminating entry */
++    /* Philips eHome Infrared Transciever */
++    { USB_DEVICE(VENDOR_PHILIPS, 0x0815) },
++    /* Philips Infrared Transciever - HP branded */
++    { USB_DEVICE(VENDOR_PHILIPS, 0x060c) },
++    /* Philips SRM5100 */
++    { USB_DEVICE(VENDOR_PHILIPS, 0x060d) },
++    /* SMK/Toshiba G83C0004D410 */
++    { USB_DEVICE(VENDOR_SMK, 0x031d) },
++    /* SMK eHome Infrared Transceiver (Sony VAIO) */
++    { USB_DEVICE(VENDOR_SMK, 0x0322) },
++    /* bundled with Hauppauge PVR-150 */
++    { USB_DEVICE(VENDOR_SMK, 0x0334) },
++    /* Tatung eHome Infrared Transceiver */
++    { USB_DEVICE(VENDOR_TATUNG, 0x9150) },
++    /* Shuttle eHome Infrared Transceiver */
++    { USB_DEVICE(VENDOR_SHUTTLE, 0xc001) },
++    /* Shuttle eHome Infrared Transceiver */
++    { USB_DEVICE(VENDOR_SHUTTLE2, 0xc001) },
++    /* Gateway eHome Infrared Transceiver */
++    { USB_DEVICE(VENDOR_GATEWAY, 0x3009) },
++    /* Mitsumi */
++    { USB_DEVICE(VENDOR_MITSUMI, 0x2501) },
++    /* Topseed eHome Infrared Transceiver */
++    { USB_DEVICE(VENDOR_TOPSEED, 0x0001) },
++    /* Topseed HP eHome Infrared Transceiver */
++    { USB_DEVICE(VENDOR_TOPSEED, 0x0006) },
++    /* Topseed eHome Infrared Transceiver */
++    { USB_DEVICE(VENDOR_TOPSEED, 0x0007) },
++    /* Topseed eHome Infrared Transceiver */
++    { USB_DEVICE(VENDOR_TOPSEED, 0x0008) },
++    /* Ricavision internal Infrared Transceiver */
++    { USB_DEVICE(VENDOR_RICAVISION, 0x0010) },
++    /* Itron ione Libra Q-11 */
++    { USB_DEVICE(VENDOR_ITRON, 0x7002) },
++    /* FIC eHome Infrared Transceiver */
++    { USB_DEVICE(VENDOR_FIC, 0x9242) },
++    /* LG eHome Infrared Transceiver */
++    { USB_DEVICE(VENDOR_LG, 0x9803) },
++    /* Microsoft MCE Infrared Transceiver */
++    { USB_DEVICE(VENDOR_MICROSOFT, 0x00a0) },
++    /* Formosa eHome Infrared Transceiver */
++    { USB_DEVICE(VENDOR_FORMOSA, 0xe015) },
++    /* Formosa aim / Trust MCE Infrared Receiver */
++    { USB_DEVICE(VENDOR_FORMOSA, 0xe017) },
++    /* Formosa Industrial Computing / Beanbag Emulation Device */
++    { USB_DEVICE(VENDOR_FORMOSA, 0xe018) },
++    /* Fintek eHome Infrared Transceiver */
++    { USB_DEVICE(VENDOR_FINTEK, 0x0602) },
++    /* Pinnacle Remote USB RC6 */
++    { USB_DEVICE(VENDOR_PINNACLE, 0x0225) },
++    /* Terminating entry */
++    { }
+ };
+ 
+ static unsigned char usb_kbd_keycode[256] = {
+@@ -1108,7 +1167,7 @@
      input_dev->name = ir->name;
      input_dev->phys = ir->phys;
      usb_to_input_id(dev, &input_dev->id);
-- 
cgit v0.12

