From 23bff84c2a9707593593fd8f451c5fc04edf7ac3 Mon Sep 17 00:00:00 2001
From: Greg Frost <gregfrost1@bigpond.com>
Date: Thu, 20 Aug 2009 19:48:55 +0930
Subject: lirc: fix syntax error in lirc.fdi

---
 abs/core-testing/lirc/PKGBUILD | 4 ++--
 abs/core-testing/lirc/lirc.fdi | 2 +-
 2 files changed, 3 insertions(+), 3 deletions(-)

diff --git a/abs/core-testing/lirc/PKGBUILD b/abs/core-testing/lirc/PKGBUILD
index 5406783..d15cf1d 100644
--- a/abs/core-testing/lirc/PKGBUILD
+++ b/abs/core-testing/lirc/PKGBUILD
@@ -3,7 +3,7 @@
 
 pkgname=lirc
 pkgver=0.8.5CVS
-pkgrel=14
+pkgrel=15
 _kernver=2.6.28-LinHES
 pkgdesc="Linux Infrared Remote Control kernel modules for stock arch kernel"
 arch=(i686 x86_64)
@@ -83,4 +83,4 @@ md5sums=('b96dae91b566143b3af433fa2714ec9a'
          'f059f4030afc682c9539a03bf837c1cf'
          '4e698654cc44fc6c4163814acda5a7ee'
          '9a3a6dc03647ee6674a166dfb884ddd6'
-         '664fb04b51396628300daf8befd0db77')
+         '203d9cd014c4276be4c84cecd103919d')
diff --git a/abs/core-testing/lirc/lirc.fdi b/abs/core-testing/lirc/lirc.fdi
index 7a8c8ad..6f2443a 100644
--- a/abs/core-testing/lirc/lirc.fdi
+++ b/abs/core-testing/lirc/lirc.fdi
@@ -3,7 +3,7 @@
 <deviceinfo version="0.2">
   <device>
      <!-- This rule prevents the Dvico dual digital4 rev 2
-          remote input device from making your keyboard act wierd>
+          remote input device from making your keyboard act wierd. -->
      <match key="info.product" contains_ncase="IR-receiver inside an USB DVB receiver">
         <merge key="info.ignore" type="bool">true</merge>
      </match>
-- 
cgit v0.12

