From ac4712c7309eb92589350836870bd882233fc7cc Mon Sep 17 00:00:00 2001
From: Cecil Hugh Watson <knoppmyth@gmail.com>
Date: Sat, 5 Sep 2009 12:19:49 -0700
Subject: PHP:Changes to php.ini for Zoneminder.

---
 abs/core-testing/php/PKGBUILD | 2 +-
 abs/core-testing/php/php.ini  | 2 +-
 2 files changed, 2 insertions(+), 2 deletions(-)

diff --git a/abs/core-testing/php/PKGBUILD b/abs/core-testing/php/PKGBUILD
index c549d56..45cc17a 100644
--- a/abs/core-testing/php/PKGBUILD
+++ b/abs/core-testing/php/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=php
 pkgver=5.2.6
-pkgrel=20
+pkgrel=21
 _suhosinver=0.9.6.2
 pkgdesc='A high-level scripting language'
 arch=('i686' 'x86_64')
diff --git a/abs/core-testing/php/php.ini b/abs/core-testing/php/php.ini
index 21c3db1..8cbcd56 100644
--- a/abs/core-testing/php/php.ini
+++ b/abs/core-testing/php/php.ini
@@ -249,7 +249,7 @@ safe_mode_protected_env_vars = LD_LIBRARY_PATH
 ; and below.  This directive makes most sense if used in a per-directory
 ; or per-virtualhost web server configuration file. This directive is
 ; *NOT* affected by whether Safe Mode is turned On or Off.
-open_basedir = /data/srv/httpd/htdocs/:/home/:/tmp/:/usr/share/pear/:/data/srv/tmp:/usr/share/mythtv/mythweather/scripts/:/data/srv/httpd/htdocs/mythweb/data/video:/myth/ipodfeed:/data/srv/httpd/htdocs/archive
+open_basedir = /data/srv/httpd/htdocs/:/home/:/tmp/:/usr/share/pear/:/data/srv/tmp:/usr/share/mythtv/mythweather/scripts/:/data/srv/httpd/htdocs/mythweb/data/video:/myth/ipodfeed:/data/srv/httpd/htdocs/archive:/etc
 
 ; This directive allows you to disable certain functions for security reasons.
 ; It receives a comma-delimited list of function names. This directive is
-- 
cgit v0.12

