From 1ff84d8aab36f76ca79c37d41dcd6b5f0d517b1d Mon Sep 17 00:00:00 2001
From: Greg Frost <gregfrost1@bigpond.com>
Date: Sat, 30 May 2009 12:54:13 +0930
Subject: lirc: update PKGBUILD to install dvico udev rule

---
 abs/core-testing/lirc/PKGBUILD | 11 ++++++++---
 1 file changed, 8 insertions(+), 3 deletions(-)

diff --git a/abs/core-testing/lirc/PKGBUILD b/abs/core-testing/lirc/PKGBUILD
index d8cfe29..30c5052 100644
--- a/abs/core-testing/lirc/PKGBUILD
+++ b/abs/core-testing/lirc/PKGBUILD
@@ -3,7 +3,7 @@
 
 pkgname=lirc
 pkgver=0.8.5CVS
-pkgrel=11
+pkgrel=12
 _kernver=2.6.28-LinHES
 pkgdesc="Linux Infrared Remote Control kernel modules for stock arch kernel"
 arch=(i686 x86_64)
@@ -21,7 +21,8 @@ source=(http://www.blushingpenguin.com/mark/lmilk/lirc-0.8.5-CVS-pvr150.tar.bz2
 	http://superb-east.dl.sourceforge.net/sourceforge/mod-mce/lirc_mod_mce-0.1.5.tar.bz2
 	lirc_mod_mce.patch
 	hw_commandir.c
-	hw_commandir.h)
+	hw_commandir.h
+	dvicoIR.rules)
 
 build() {
 	# configure
@@ -65,6 +66,9 @@ build() {
 	rm $startdir/pkg/lib/modules/$_kernver/kernel/drivers/misc/lirc_cmdir.ko
 	rm $startdir/pkg/lib/modules/$_kernver/kernel/drivers/misc/commandir.ko
 
+	# Add a udev rule for the DVICO remote so that if there is more than 
+	# one hiddev device, the systm cant get confused.
+	install -D -m644 $srcdir/dvicoIR.rules $pkgdir/etc/udev/rules.d/dvicoIR.rules
 }
 md5sums=('b96dae91b566143b3af433fa2714ec9a'
          '1753acd774f50b638e6173d364de53fd'
@@ -73,4 +77,5 @@ md5sums=('b96dae91b566143b3af433fa2714ec9a'
          '21ce358809105f005e888e3b138c59e6'
          'd299b696b007fc9b663a73cc1758a1ef'
          'f059f4030afc682c9539a03bf837c1cf'
-         '4e698654cc44fc6c4163814acda5a7ee')
+         '4e698654cc44fc6c4163814acda5a7ee'
+         'd79400e2e3069b14039ca07d3317965c')
-- 
cgit v0.12

