From 528268bf6b14f8e3c9f4941d5587d982ff1892d6 Mon Sep 17 00:00:00 2001
From: Greg Frost <gregfrost1@bigpond.com>
Date: Sat, 30 May 2009 13:12:51 +0930
Subject: runit-scripts: update the lircd run script to use the dvicoIR sym
 link

---
 abs/core-testing/runit-scripts/PKGBUILD                        | 3 ++-
 abs/core-testing/runit-scripts/runitscripts/services/lircd/run | 4 ++--
 2 files changed, 4 insertions(+), 3 deletions(-)

diff --git a/abs/core-testing/runit-scripts/PKGBUILD b/abs/core-testing/runit-scripts/PKGBUILD
index 6596371..0644c3b 100755
--- a/abs/core-testing/runit-scripts/PKGBUILD
+++ b/abs/core-testing/runit-scripts/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=runit-scripts
 pkgver=1.8.0
-pkgrel=83
+pkgrel=84
 pkgdesc="collection of startup scripts for runit"
 url="http://smarden.org/runit/"
 license="BSD"
@@ -28,3 +28,4 @@ build() {
   install -m0755 reboot-runit halt-runit logger $startdir/pkg/sbin
   rsync -a --exclude=.svn services/* $startdir/pkg/etc/sv
 }
+md5sums=('c6cbd6af3657783bd1ce8f75f574d72f')
diff --git a/abs/core-testing/runit-scripts/runitscripts/services/lircd/run b/abs/core-testing/runit-scripts/runitscripts/services/lircd/run
index 59206ae..6d67537 100755
--- a/abs/core-testing/runit-scripts/runitscripts/services/lircd/run
+++ b/abs/core-testing/runit-scripts/runitscripts/services/lircd/run
@@ -106,7 +106,7 @@ else
         if [ $RunDvico = "true" -a $num_lirc -lt 0 ]
         then
 	        #only run dvicio
-	        LCMD="/usr/sbin/lircd -n -d /dev/usb/hiddev0 --driver=dvico  --output /dev/lircd"
+	        LCMD="/usr/sbin/lircd -n -d /dev/usb/dvicoIR --driver=dvico  --output /dev/lircd"
 	    #      echo $LCMD
 		printhl "	Device Dvicio"
 		
@@ -115,7 +115,7 @@ else
         then
             #chain them together
             i=$((i+1))
-            CMD="/usr/sbin/lircd -d /dev/usb/hiddev0 --driver=dvico  --output=/dev/lircd$i --pidfile=/var/run/lircd$i.pid --listen=876$i"
+            CMD="/usr/sbin/lircd -d /dev/usb/dvicoIR --driver=dvico  --output=/dev/lircd$i --pidfile=/var/run/lircd$i.pid --listen=876$i"
     #        echo $CMD
             $CMD >> $LOG
             LASTCMD="--connect=localhost:876$i   $LASTCMD    "
-- 
cgit v0.12

