From 5f0636852bb64adc0c561368b0310926c2f0b793 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Mon, 2 Feb 2009 16:29:36 -0600
Subject: comment out atomic ant detection code. This causes systemconfig.sh to
 fail during install.

---
 abs/core-testing/LinHES-config/PKGBUILD        |  2 +-
 abs/core-testing/LinHES-config/systemconfig.sh | 16 ++++++++--------
 2 files changed, 9 insertions(+), 9 deletions(-)

diff --git a/abs/core-testing/LinHES-config/PKGBUILD b/abs/core-testing/LinHES-config/PKGBUILD
index 745e7e7..4c06690 100755
--- a/abs/core-testing/LinHES-config/PKGBUILD
+++ b/abs/core-testing/LinHES-config/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=LinHES-config
 pkgver=1.0
-pkgrel=235
+pkgrel=236
 conflicts=(MythVantage-config MythVantage-config-dev LinHES-config-dev )
 pkgdesc="Install and configure your system"
 depends=(bc libstatgrab  mysql-python expect curl dnsutils parted sg3_utils nmbscan )
diff --git a/abs/core-testing/LinHES-config/systemconfig.sh b/abs/core-testing/LinHES-config/systemconfig.sh
index 0a25cbd..1bad622 100755
--- a/abs/core-testing/LinHES-config/systemconfig.sh
+++ b/abs/core-testing/LinHES-config/systemconfig.sh
@@ -165,14 +165,14 @@ ln -s "/usr/share/zoneinfo/$timezone"  ${BASE}/etc/localtime
        # echo CLOCK_SYSTOCH="yes" >> ${BASE}/etc/conf.d/clock
        # echo TIMEZONE="$timezone" >> ${BASE}/etc/conf.d/clock
 cp_and_log $TEMPLATES/rc.conf /etc/rc.conf.1
-#Check for Atomic Ant
-if grep disablemodules=agpart,intel_agp /proc/cmdline >/dev/null
-then
-	cat /etc/rc.conf.1 |  sed -e '/MOD_BLACKLIST/ c\MOD_BLACKLIST=($ALSABLACKLIST agpart intel_agp)' > /etc/rc.conf
-	rm -fr /etc/rc.conf.1
-else
-	exit 1
-fi
+# #Check for Atomic Ant
+# if grep disablemodules=agpart,intel_agp /proc/cmdline >/dev/null
+# then
+# 	cat /etc/rc.conf.1 |  sed -e '/MOD_BLACKLIST/ c\MOD_BLACKLIST=($ALSABLACKLIST agpart intel_agp)' > /etc/rc.conf
+# 	rm -fr /etc/rc.conf.1
+# else
+# 	exit 1
+# fi
 
 }
 
-- 
cgit v0.12

