From 7fbe2eccb1d7ff24f443fc42d90594014d8449be Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Sat, 17 Jan 2009 18:36:36 -0600
Subject: switch ctr+alt+delete to reboot instead of poweroff. closes FS#98

---
 abs/core-testing/runit-scripts/PKGBUILD                    | 2 +-
 abs/core-testing/runit-scripts/runitscripts/ctrlaltdel     | 7 +------
 abs/core-testing/runit-scripts/runitscripts/ctrlaltdel.off | 9 +++++++++
 3 files changed, 11 insertions(+), 7 deletions(-)
 create mode 100755 abs/core-testing/runit-scripts/runitscripts/ctrlaltdel.off

diff --git a/abs/core-testing/runit-scripts/PKGBUILD b/abs/core-testing/runit-scripts/PKGBUILD
index d74ab16..ccd0d1f 100755
--- a/abs/core-testing/runit-scripts/PKGBUILD
+++ b/abs/core-testing/runit-scripts/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=runit-scripts
 pkgver=1.8.0
-pkgrel=23
+pkgrel=26
 pkgdesc="collection of startup scripts for runit"
 url="http://smarden.org/runit/"
 license="BSD"
diff --git a/abs/core-testing/runit-scripts/runitscripts/ctrlaltdel b/abs/core-testing/runit-scripts/runitscripts/ctrlaltdel
index 2550d3c..30c317b 100755
--- a/abs/core-testing/runit-scripts/runitscripts/ctrlaltdel
+++ b/abs/core-testing/runit-scripts/runitscripts/ctrlaltdel
@@ -1,9 +1,4 @@
 #!/bin/sh
 
 PATH=/bin:/usr/bin
-MSG="System is going down in 10 seconds..."
-
-# echo 'disabled.' ; exit
-touch /etc/runit/stopit
-chmod 100 /etc/runit/stopit && echo "$MSG" | wall
-/bin/sleep 10
+/sbin/reboot
diff --git a/abs/core-testing/runit-scripts/runitscripts/ctrlaltdel.off b/abs/core-testing/runit-scripts/runitscripts/ctrlaltdel.off
new file mode 100755
index 0000000..2550d3c
--- /dev/null
+++ b/abs/core-testing/runit-scripts/runitscripts/ctrlaltdel.off
@@ -0,0 +1,9 @@
+#!/bin/sh
+
+PATH=/bin:/usr/bin
+MSG="System is going down in 10 seconds..."
+
+# echo 'disabled.' ; exit
+touch /etc/runit/stopit
+chmod 100 /etc/runit/stopit && echo "$MSG" | wall
+/bin/sleep 10
-- 
cgit v0.12

