From 07c218234e0b6afaf6e2c9b053e7d8217648fa9c Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Tue, 7 Aug 2012 12:32:43 -0500
Subject: linux-firmware: removed

---
 abs/core/linux-firmware/__changelog        |   1 -
 abs/core/linux-firmware/v4l-cx23885-enc.fw | Bin 376836 -> 0 bytes
 2 files changed, 1 deletion(-)
 delete mode 100644 abs/core/linux-firmware/__changelog
 delete mode 100644 abs/core/linux-firmware/v4l-cx23885-enc.fw

diff --git a/abs/core/linux-firmware/__changelog b/abs/core/linux-firmware/__changelog
deleted file mode 100644
index 0ac04b7..0000000
--- a/abs/core/linux-firmware/__changelog
+++ /dev/null
@@ -1 +0,0 @@
-- replace v4l-cx23885-enc.fw in linux firmware because it is the wrong file.
diff --git a/abs/core/linux-firmware/v4l-cx23885-enc.fw b/abs/core/linux-firmware/v4l-cx23885-enc.fw
deleted file mode 100644
index 25a2915..0000000
Binary files a/abs/core/linux-firmware/v4l-cx23885-enc.fw and /dev/null differ
-- 
cgit v0.12

