From 1468cf62b07b10ab3d87bca6f54b20dc8b816abd Mon Sep 17 00:00:00 2001
From: Britney Fransen <brfransen@gmail.com>
Date: Thu, 7 Nov 2013 09:23:43 -0600
Subject: supplemental-web: bestart.cgi, bestop.cgi, beclear.cgi: update OSD
 messages

---
 abs/core/supplemental-web/PKGBUILD        |  2 +-
 abs/core/supplemental-web/cgi/beclear.cgi |  2 +-
 abs/core/supplemental-web/cgi/bestart.cgi | 15 +++++++++------
 abs/core/supplemental-web/cgi/bestop.cgi  | 15 ++++++++-------
 4 files changed, 19 insertions(+), 15 deletions(-)

diff --git a/abs/core/supplemental-web/PKGBUILD b/abs/core/supplemental-web/PKGBUILD
index 090b6ec..5448bcc 100644
--- a/abs/core/supplemental-web/PKGBUILD
+++ b/abs/core/supplemental-web/PKGBUILD
@@ -1,7 +1,7 @@
 pkgbase=supplemental-web
 pkgname=('supplemental-web' 'supplemental-web-slave')
 pkgver=8.0
-pkgrel=11
+pkgrel=12
 arch=('i686' 'x86_64')
 license=('GPL')
 backup=('data/srv/httpd/cgi/extra.cfg.txt')
diff --git a/abs/core/supplemental-web/cgi/beclear.cgi b/abs/core/supplemental-web/cgi/beclear.cgi
index 489466d..941c958 100644
--- a/abs/core/supplemental-web/cgi/beclear.cgi
+++ b/abs/core/supplemental-web/cgi/beclear.cgi
@@ -1,4 +1,4 @@
 #!/bin/bash
 /usr/bin/mythbackend --clearcache
-MESSAGE="settings cache is cleared "
+MESSAGE="MythBackend Settings Cache Cleared"
 #/usr/bin/notify.py SYS  "$MESSAGE" 2>/dev/null
diff --git a/abs/core/supplemental-web/cgi/bestart.cgi b/abs/core/supplemental-web/cgi/bestart.cgi
index e09e42b..a7a49b2 100644
--- a/abs/core/supplemental-web/cgi/bestart.cgi
+++ b/abs/core/supplemental-web/cgi/bestart.cgi
@@ -1,10 +1,13 @@
 #!/bin/bash
-# MESSAGE="Trying to start `hostname` B.E."
-# /usr/bin/func "*" call msg display "$MESSAGE" &
+#MESSAGE="Starting `hostname` MythBackend"
+#/usr/bin/func "*" call msg display "$MESSAGE" &
 
-sudo /sbin/sv start mythbackend
-
-MESSAGE="`hostname` B.E. started"
-/usr/bin/func "*" call msg display "$MESSAGE" &
+svresult=`sudo /sbin/sv start mythbackend`
 
+if [[ $svresult == *"run: "* ]]; then
+    MESSAGE="`hostname` MythBackend Started"
+else
+    MESSAGE="`hostname` MythBackend didn't Start\nCheck MythBackend Log"
+fi
 
+/usr/bin/func "*" call msg display "$MESSAGE" &
diff --git a/abs/core/supplemental-web/cgi/bestop.cgi b/abs/core/supplemental-web/cgi/bestop.cgi
index c9d7fad..2d31904 100644
--- a/abs/core/supplemental-web/cgi/bestop.cgi
+++ b/abs/core/supplemental-web/cgi/bestop.cgi
@@ -1,12 +1,13 @@
 #!/bin/bash
-MESSAGE="Trying to stop `hostname` B.E."
-/usr/bin/func "*" call msg display "$MESSAGE" &
-
-sudo /sbin/sv stop mythbackend
-
-MESSAGE="`hostname` B.E. stopped"
+MESSAGE="Stopping `hostname` MythBackend..."
 /usr/bin/func "*" call msg display "$MESSAGE" &
 
+svresult=`sudo /sbin/sv stop mythbackend`
 
+if [[ $svresult == *"down: "* ]]; then
+    MESSAGE="`hostname` MythBackend Stopped"
+else
+    MESSAGE="`hostname` MythBackend didn't Stop"
+fi
 
-
+/usr/bin/func "*" call msg display "$MESSAGE" &
-- 
cgit v0.12

