From 66749c2b24e28a61cab66eacb227c5ffec354f45 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Tue, 22 Oct 2013 19:34:07 -0500
Subject: discover_infintv:  meant to use 15 instead of 12 seconds for the
 timeout.

---
 abs/core/LinHES-config/PKGBUILD             | 2 +-
 abs/core/LinHES-config/discover_infinitv.py | 2 +-
 2 files changed, 2 insertions(+), 2 deletions(-)

diff --git a/abs/core/LinHES-config/PKGBUILD b/abs/core/LinHES-config/PKGBUILD
index 4e8126c..447458e 100755
--- a/abs/core/LinHES-config/PKGBUILD
+++ b/abs/core/LinHES-config/PKGBUILD
@@ -181,4 +181,4 @@ md5sums=('c832059cd635359d39a2ac3166ff463c'
          'c9279fa095af624ee3d9bc75d3328360'
          '02cf69074d2bbacef05fa3e451af9af3'
          '85d15efc55074a94c58d44542ea1dd13'
-         'fc46639bf528057338881047ed1498b6')
+         '7acbd2064db905e76372a0618b24a6d9')
diff --git a/abs/core/LinHES-config/discover_infinitv.py b/abs/core/LinHES-config/discover_infinitv.py
index c9c2ea6..421ba84 100755
--- a/abs/core/LinHES-config/discover_infinitv.py
+++ b/abs/core/LinHES-config/discover_infinitv.py
@@ -74,7 +74,7 @@ if __name__ == "__main__":
     try:
         timeout = float(sys.argv[2])
     except:
-        timeout=12
+        timeout=15
     L = find_the_infiniTV(interface_ip=interface_ip)
     thread.start_new_thread(L.listen, ())
     time.sleep(timeout)
-- 
cgit v0.12

