From 919f5ab8be044a58f577ff4e5823879d39c50330 Mon Sep 17 00:00:00 2001
From: Cecil <knoppmyth@gmail.com>
Date: Wed, 20 Jul 2011 21:01:10 -0700
Subject: kernel26:Bump

---
 abs/core/kernel26/PKGBUILD |  4 ++--
 abs/core/kernel26/config   | 16 ++++++++++------
 2 files changed, 12 insertions(+), 8 deletions(-)

diff --git a/abs/core/kernel26/PKGBUILD b/abs/core/kernel26/PKGBUILD
index 310e9ed..be05ea5 100644
--- a/abs/core/kernel26/PKGBUILD
+++ b/abs/core/kernel26/PKGBUILD
@@ -8,7 +8,7 @@ pkgname=('kernel26' 'kernel26-headers' 'kernel26-docs') # Build stock -ARCH kern
 _kernelname=${pkgname#kernel26}
 _basekernel=2.6.39
 pkgver=${_basekernel}.3
-pkgrel=4
+pkgrel=6
 depends=('module-init-tools>=3.16')
 makedepends=('xmlto' 'docbook-xsl')
 _archpatch=1
@@ -280,6 +280,6 @@ md5sums=('1aab7a741abe08d42e8eccf20de61e05'
          '351469fd75d3fa848398728360c6ffa4'
          '3b4a1df8e1f584446918f76cfca66e9b'
          '93d83faea1144a5dbd6df0f42148fb7f'
-         '77568228f1352d1f1b95700209fb53de'
+         '50e3942e6a36f1b25d8986656499a9c2'
          '8be1f60e54eb505b7e67d39fd2233103'
          '25584700a0a679542929c4bed31433b6')
diff --git a/abs/core/kernel26/config b/abs/core/kernel26/config
index 349f527..19b6150 100644
--- a/abs/core/kernel26/config
+++ b/abs/core/kernel26/config
@@ -1,7 +1,7 @@
 #
 # Automatically generated make config: don't edit
 # Linux/i386 2.6.39 Kernel Configuration
-# Wed Jul 20 05:42:40 2011
+# Thu Jul 21 03:11:28 2011
 #
 # CONFIG_64BIT is not set
 CONFIG_X86_32=y
@@ -278,7 +278,7 @@ CONFIG_FREEZER=y
 # Processor type and features
 #
 CONFIG_TICK_ONESHOT=y
-# CONFIG_NO_HZ is not set
+CONFIG_NO_HZ=y
 CONFIG_HIGH_RES_TIMERS=y
 CONFIG_GENERIC_CLOCKEVENTS_BUILD=y
 CONFIG_SMP=y
@@ -435,8 +435,8 @@ CONFIG_SECCOMP=y
 CONFIG_CC_STACKPROTECTOR=y
 # CONFIG_HZ_100 is not set
 # CONFIG_HZ_250_NODEFAULT is not set
-CONFIG_HZ_300=y
-# CONFIG_HZ_1000 is not set
+# CONFIG_HZ_300 is not set
+CONFIG_HZ_1000=y
 # CONFIG_HZ_1500 is not set
 # CONFIG_HZ_2000 is not set
 # CONFIG_HZ_3000 is not set
@@ -444,7 +444,7 @@ CONFIG_HZ_300=y
 # CONFIG_HZ_5000 is not set
 # CONFIG_HZ_7500 is not set
 # CONFIG_HZ_10000 is not set
-CONFIG_HZ=300
+CONFIG_HZ=1000
 CONFIG_SCHED_HRTICK=y
 CONFIG_KEXEC=y
 # CONFIG_CRASH_DUMP is not set
@@ -519,8 +519,13 @@ CONFIG_APM_DO_ENABLE=y
 # CPU Frequency scaling
 #
 # CONFIG_CPU_FREQ is not set
+# CONFIG_CPU_FREQ_DEFAULT_GOV_PERFORMANCE is not set
+# CONFIG_CPU_FREQ_DEFAULT_GOV_USERSPACE is not set
+# CONFIG_CPU_FREQ_DEFAULT_GOV_ONDEMAND is not set
+# CONFIG_CPU_FREQ_DEFAULT_GOV_CONSERVATIVE is not set
 CONFIG_CPU_IDLE=y
 CONFIG_CPU_IDLE_GOV_LADDER=y
+CONFIG_CPU_IDLE_GOV_MENU=y
 CONFIG_INTEL_IDLE=y
 
 #
@@ -2875,7 +2880,6 @@ CONFIG_SPI_TLE62X0=m
 #
 CONFIG_PPS=m
 # CONFIG_PPS_DEBUG is not set
-# CONFIG_NTP_PPS is not set
 
 #
 # PPS clients support
-- 
cgit v0.12

