From a14f5c5af59be4f25ef3d76cd12f1d35f583e59f Mon Sep 17 00:00:00 2001
From: Britney Fransen <brfransen@gmail.com>
Date: Thu, 5 Feb 2015 17:46:39 +0000
Subject: LinHES-system: myth_mtc.cron: log to local6 so rsyslog myth rule
 catches

---
 abs/core/LinHES-system/PKGBUILD      |  4 ++--
 abs/core/LinHES-system/myth_mtc.cron | 23 ++++++++++++-----------
 2 files changed, 14 insertions(+), 13 deletions(-)

diff --git a/abs/core/LinHES-system/PKGBUILD b/abs/core/LinHES-system/PKGBUILD
index 2f77eaf..3db2a65 100755
--- a/abs/core/LinHES-system/PKGBUILD
+++ b/abs/core/LinHES-system/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=LinHES-system
 pkgver=8.3
-pkgrel=4
+pkgrel=5
 arch=('i686' 'x86_64')
 install=system.install
 pkgdesc="Everything that makes LinHES an automated system"
@@ -132,7 +132,7 @@ md5sums=('8415c4b2587a8a1e6a312484c1edafcb'
          '410795ef9039e4c6c0484e706ecfd567'
          'eb879fee9603a05d5420d4ce8ed9e450'
          '02c810c2f47b7c4495fdacaf54189473'
-         '4559a466e2dd2141308bd44f7794e837'
+         '28ce5d884ee608b0479d4bf2a64697db'
          '474d5c6883fcfffae4f199aceb3b1356'
          '8fe800181dcdf45bb7d7b36e4de8409e'
          '36bdfa8d877cea20ca3870faf08e08d5'
diff --git a/abs/core/LinHES-system/myth_mtc.cron b/abs/core/LinHES-system/myth_mtc.cron
index 637c0d6..0c098f1 100755
--- a/abs/core/LinHES-system/myth_mtc.cron
+++ b/abs/core/LinHES-system/myth_mtc.cron
@@ -6,10 +6,11 @@ date=`date +%Y-%m-%d`
 timestamp=`date +'%Y-%m-%d %H:%M'`
 hostname=`hostname`
 logFile="/var/log/${date}/${hostname}_myth_mtc.log"
+log="logger -t myth_mtc -p local6.info"
 
 if [ ! -f $logFile ]; then
     touch $logFile
-    echo "" | logger -t myth_mtc
+    echo "" | $log
 fi
 
 #check logfile for Finished and if not run myth_mtc.py
@@ -17,42 +18,42 @@ if ! grep -q "Finished Maintenance" $logFile
 then
     if ! grep -q "Finished Optimize" $logFile
     then
-        MYTHCONFDIR=/usr/share/mythtv unbuffer myth_mtc.py --optimize | logger -t myth_mtc
+        MYTHCONFDIR=/usr/share/mythtv unbuffer myth_mtc.py --optimize | $log
         if [ $? = 0 ]
         then
-            echo "" | logger -t myth_mtc
+            echo "" | $log
         else
-            echo "Time Exceeded" | logger -t myth_mtc
+            echo "Time Exceeded" | $log
             exit
         fi
     fi
 
     if ! grep -q "Finished Backup" $logFile
     then
-        MYTHCONFDIR=/usr/share/mythtv unbuffer myth_mtc.py --backup | logger -t myth_mtc
+        MYTHCONFDIR=/usr/share/mythtv unbuffer myth_mtc.py --backup | $log
         if [ $? = 0 ]
         then
-            echo "" | logger -t myth_mtc
+            echo "" | $log
         else
-            echo "Time Exceeded" | logger -t myth_mtc
+            echo "Time Exceeded" | $log
             exit
         fi
     fi
 
     if ! grep -q "Finished Update" $logFile
     then
-        MYTHCONFDIR=/usr/share/mythtv unbuffer myth_mtc.py --update | logger -t myth_mtc
+        MYTHCONFDIR=/usr/share/mythtv unbuffer myth_mtc.py --update | $log
         if [ $? = 0 ]
         then
-            echo "" | logger -t myth_mtc
+            echo "" | $log
         else
-            echo "Time Exceeded" | logger -t myth_mtc
+            echo "Time Exceeded" | $log
             exit
         fi
     fi
 
     if grep -q "Finished Optimize" $logFile && grep -q "Finished Backup" $logFile && grep -q "Finished Update" $logFile
     then
-        echo "Finished Maintenance" | logger -t myth_mtc
+        echo "Finished Maintenance" | $log
     fi
 fi
-- 
cgit v0.12

