From aa51de14e24f00cb4a5481e20823f7aa491ced27 Mon Sep 17 00:00:00 2001
From: Britney Fransen <brfransen@gmail.com>
Date: Tue, 7 Mar 2017 18:56:27 +0000
Subject: runit-scripts: vnc/run: change geometry to 1920x1080

mythinstall service menu items don't respect the -geometry switch and don't show correctly in vnc when host has large screen sizes
---
 abs/core/runit-scripts/PKGBUILD                      | 2 +-
 abs/core/runit-scripts/runitscripts/services/vnc/run | 2 +-
 2 files changed, 2 insertions(+), 2 deletions(-)

diff --git a/abs/core/runit-scripts/PKGBUILD b/abs/core/runit-scripts/PKGBUILD
index f31881e..96959be 100755
--- a/abs/core/runit-scripts/PKGBUILD
+++ b/abs/core/runit-scripts/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=runit-scripts
 pkgver=8.4
-pkgrel=3
+pkgrel=4
 pkgdesc="collection of startup scripts for runit"
 url="http://smarden.org/runit/"
 license=('BSD')
diff --git a/abs/core/runit-scripts/runitscripts/services/vnc/run b/abs/core/runit-scripts/runitscripts/services/vnc/run
index b67d174..c168251 100755
--- a/abs/core/runit-scripts/runitscripts/services/vnc/run
+++ b/abs/core/runit-scripts/runitscripts/services/vnc/run
@@ -7,7 +7,7 @@ MYTH_RUN_STATUS="1"
 . /etc/rc.d/functions
 . /etc/profile
 stat_runit "Starting vnc service"
-geometry=1024x768
+geometry=1920x1080
 #. /etc/conf.d/vncserver 2>/dev/null
 cp -f $MV_ROOT/templates/vnc.service /etc/avahi/services/vnc.service 2>/dev/null
 cd ~vncsvc
-- 
cgit v0.12

