From c04f2dfff3a4abbe0e3b4a7247f0001f797b07ac Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Sun, 13 May 2012 18:12:59 -0500
Subject: LinHES-config: install_proxy.sh additional debug output for network
 checks.

---
 abs/core/LinHES-config/PKGBUILD         |  4 ++--
 abs/core/LinHES-config/install_proxy.sh | 11 ++++++++---
 2 files changed, 10 insertions(+), 5 deletions(-)

diff --git a/abs/core/LinHES-config/PKGBUILD b/abs/core/LinHES-config/PKGBUILD
index 22da3a3..d30fc63 100644
--- a/abs/core/LinHES-config/PKGBUILD
+++ b/abs/core/LinHES-config/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=LinHES-config
 pkgver=2.3
-pkgrel=75
+pkgrel=76
 conflicts=(MythVantage-config MythVantage-config-dev LinHES-config-dev LinHes-config )
 pkgdesc="Install and configure your system"
 depends=('bc' 'libstatgrab'  'mysql-python' 'expect' 'curl' 'dnsutils' 'parted'
@@ -109,7 +109,7 @@ md5sums=('18af4fe481e1fc2ae02050026eb5cd27'
          '16b98fcb3753ef6cfc35075c326d30e4'
          'e36da536dd651ef182e7642337889e77'
          '985891a43f7c4c983eb2a362162f1a0f'
-         '2f0b85d37b15956b3d92419c886e040c'
+         '3f5693c76c7e483dd3c2184bc2546c82'
          '5a31addfbdc1154b05997f972a32fa33'
          'c20f73d4da5d7e15e1f3eb85c7dcb49a'
          '68199e861c2933ccbb84735b9b440157'
diff --git a/abs/core/LinHES-config/install_proxy.sh b/abs/core/LinHES-config/install_proxy.sh
index 4bb2444..2449874 100755
--- a/abs/core/LinHES-config/install_proxy.sh
+++ b/abs/core/LinHES-config/install_proxy.sh
@@ -119,6 +119,7 @@ case $1 in
                                         echo " network check nameserver"
                                         mydns=`cat /etc/resolv.conf|grep nameserver|head -1|awk '{ print $2}'`
                                         ping -c 1 $mydns
+                                        echo " DNS server is $mydns"
                                         if [ ! $? = 0 ]
                                         then
                                             exit 5
@@ -170,14 +171,18 @@ case $1 in
                                             echo "Assuming hostname is OK"
                                             echo "DNS unknown: $unkownhostip"
                                             echo "    HOSTDNS: $hoip       "
+                                            echo "    HOST: "
                                             /sbin/ifconfig -a |grep "inet addr"
+                                            status=0
                                         else
                                             echo "IP in DNS but doesn't match mine, hostname is not safe to use"
-                                            echo "DNS:$hoip"
-                                            echo "HOST: "
+                                            echo " hout: $hout"
+                                            echo "    DNS unknown: $unkownhostip"
+                                            echo "    DNS IP:$hoip"
+                                            echo "    HOST: "
                                             /sbin/ifconfig -a |grep "inet addr"
                                             status=7
-                                            fi
+                                        fi
                                     fi
                                 else
                                     echo "Couldn't find hostname in DNS, must be safe to use"
-- 
cgit v0.12

