From d18de3f6f6b90f0668d8918d6e7542ef12c6fab7 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Sat, 12 May 2012 17:10:17 -0500
Subject: runit-scripts:  add ncid-client, ncid-server, ncid-logger

---
 abs/core/runit-scripts/PKGBUILD                           |  2 +-
 .../runit-scripts/runitscripts/services/ncid-client/run   | 10 ++++++++++
 .../runit-scripts/runitscripts/services/ncid-logger/run   | 11 +++++++++++
 .../runit-scripts/runitscripts/services/ncid-server/run   | 15 +++++++++++++++
 4 files changed, 37 insertions(+), 1 deletion(-)
 create mode 100644 abs/core/runit-scripts/runitscripts/services/ncid-client/run
 create mode 100644 abs/core/runit-scripts/runitscripts/services/ncid-logger/run
 create mode 100644 abs/core/runit-scripts/runitscripts/services/ncid-server/run

diff --git a/abs/core/runit-scripts/PKGBUILD b/abs/core/runit-scripts/PKGBUILD
index f9b379e..9e73603 100755
--- a/abs/core/runit-scripts/PKGBUILD
+++ b/abs/core/runit-scripts/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=runit-scripts
 pkgver=2.1.1
-pkgrel=64
+pkgrel=66
 pkgdesc="collection of startup scripts for runit"
 url="http://smarden.org/runit/"
 license="BSD"
diff --git a/abs/core/runit-scripts/runitscripts/services/ncid-client/run b/abs/core/runit-scripts/runitscripts/services/ncid-client/run
new file mode 100644
index 0000000..80c2af5
--- /dev/null
+++ b/abs/core/runit-scripts/runitscripts/services/ncid-client/run
@@ -0,0 +1,10 @@
+#!/bin/sh
+#
+# Start/stop the ncid-client 
+#
+. /etc/rc.conf
+. /etc/rc.d/functions
+. /etc/systemconfig
+stat_runit "Starting caller id client (ncid-client)"
+exec 2>&1
+exec /usr/bin/ncid --no-gui --program /usr/share/ncid/ncid-linhes  $dbhost 3333
diff --git a/abs/core/runit-scripts/runitscripts/services/ncid-logger/run b/abs/core/runit-scripts/runitscripts/services/ncid-logger/run
new file mode 100644
index 0000000..56f10d4
--- /dev/null
+++ b/abs/core/runit-scripts/runitscripts/services/ncid-logger/run
@@ -0,0 +1,11 @@
+#!/bin/sh
+#
+# Start/stop the ncid-client 
+#
+. /etc/rc.conf
+. /etc/rc.d/functions
+. /etc/systemconfig
+sv start ncid-server
+stat_runit "Starting caller id logger"
+exec 2>&1
+exec /usr/bin/ncid --no-gui --program /usr/bin/ncid-log.py  127.0.0.1 3333
diff --git a/abs/core/runit-scripts/runitscripts/services/ncid-server/run b/abs/core/runit-scripts/runitscripts/services/ncid-server/run
new file mode 100644
index 0000000..126909d
--- /dev/null
+++ b/abs/core/runit-scripts/runitscripts/services/ncid-server/run
@@ -0,0 +1,15 @@
+#!/bin/sh
+#
+# Start/stop the ncid-client 
+#
+. /etc/rc.conf
+. /etc/rc.d/functions
+. /etc/systemconfig
+stat_runit "Starting caller id server (ncid)"
+exec 2>&1
+if [ -f /etc/ncid/ncidd-user.conf ]
+then
+    exec /usr/sbin/ncidd -D -C /etc/ncid/ncidd-user.conf 
+else
+    exec /usr/sbin/ncidd -D -t /dev/$nciddSerialPort
+fi
-- 
cgit v0.12

