From 39576222150a6983f7ba63ba2583c8a5e7374aab Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Mon, 3 Sep 2012 14:16:59 -0500
Subject: mythinstall:  new build.. change message for vnc password to include
 message about failing

---
 abs/core/mythinstall/PKGBUILD | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/abs/core/mythinstall/PKGBUILD b/abs/core/mythinstall/PKGBUILD
index 9c18670..d031119 100644
--- a/abs/core/mythinstall/PKGBUILD
+++ b/abs/core/mythinstall/PKGBUILD
@@ -1,7 +1,7 @@
 # Maintainer: Jams
 pkgname=mythinstall
 pkgver=3
-pkgrel=38
+pkgrel=40
 pkgdesc="LinHES installer/systemconfig GUI."
 arch=('i686'  'x86_64')
 depends=('mythtv>=0.25')
-- 
cgit v0.12

