From 3fc303041b0c38ef9d1f74e0be21fbbd5557e0d0 Mon Sep 17 00:00:00 2001
From: Britney Fransen <brfransen@gmail.com>
Date: Sat, 28 Sep 2013 14:12:07 -0500
Subject: runit-scripts: shellinaboxd run: add --no-beep to eliminate plugin
 error

---
 abs/core/runit-scripts/PKGBUILD                               | 2 +-
 abs/core/runit-scripts/runitscripts/services/shellinaboxd/run | 2 +-
 2 files changed, 2 insertions(+), 2 deletions(-)

diff --git a/abs/core/runit-scripts/PKGBUILD b/abs/core/runit-scripts/PKGBUILD
index f3ef203..9354ae2 100755
--- a/abs/core/runit-scripts/PKGBUILD
+++ b/abs/core/runit-scripts/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=runit-scripts
 pkgver=8.0
-pkgrel=4
+pkgrel=5
 pkgdesc="collection of startup scripts for runit"
 url="http://smarden.org/runit/"
 license="BSD"
diff --git a/abs/core/runit-scripts/runitscripts/services/shellinaboxd/run b/abs/core/runit-scripts/runitscripts/services/shellinaboxd/run
index bfc6018..bc94a73 100755
--- a/abs/core/runit-scripts/runitscripts/services/shellinaboxd/run
+++ b/abs/core/runit-scripts/runitscripts/services/shellinaboxd/run
@@ -6,4 +6,4 @@ export TERM=linux
 stat_runit "Starting shellinabox"
 
 
-exec  su - mythtv -c "shellinaboxd -c /etc/lighttpd/"
+exec  su - mythtv -c "shellinaboxd -c /etc/lighttpd/ --no-beep"
-- 
cgit v0.12

