From 4602b681336dd8fb41ecad73d836780d0da68850 Mon Sep 17 00:00:00 2001
From: Britney Fransen <brfransen@gmail.com>
Date: Tue, 18 Sep 2012 12:14:15 -0500
Subject: linhes-scripts: mythwelcome-config.py: use idle.sh for pre shutdown
 check. refs #851

---
 abs/core/linhes-scripts/PKGBUILD              | 4 ++--
 abs/core/linhes-scripts/mythwelcome-config.py | 2 +-
 2 files changed, 3 insertions(+), 3 deletions(-)

diff --git a/abs/core/linhes-scripts/PKGBUILD b/abs/core/linhes-scripts/PKGBUILD
index 6f70ebe..51f7a0b 100644
--- a/abs/core/linhes-scripts/PKGBUILD
+++ b/abs/core/linhes-scripts/PKGBUILD
@@ -3,7 +3,7 @@
 
 pkgname=linhes-scripts
 pkgver=7
-pkgrel=49
+pkgrel=50
 pkgdesc="Various scripts that help to make LinHES, LinHES."
 arch=('i686' 'x86_64')
 license=('GPL2')
@@ -81,7 +81,7 @@ md5sums=('f56985b2d602e11dc1e10d3e7848b2a5'
          'ac2a4a6b4100f4d7bfb9ecd9356c8c6e'
          'd2b475821f902c5e081e7da43a35e6ac'
          '95c092f67036a361ef7a57436f44332e'
-         '565ebca7b88bcd083322b7324f8e56e5'
+         '20ffe6edf6a0114237734baa0d2e84fd'
          '3b776bbff68906ddc2f62b7e0dde3fe4'
          'a57641fb63d7bb6d92a438f1ea779a57'
          '3d0adf26280cde55a0c47188fff34826'
diff --git a/abs/core/linhes-scripts/mythwelcome-config.py b/abs/core/linhes-scripts/mythwelcome-config.py
index a8a8960..c0f442e 100755
--- a/abs/core/linhes-scripts/mythwelcome-config.py
+++ b/abs/core/linhes-scripts/mythwelcome-config.py
@@ -24,4 +24,4 @@ if mythdb.settings[localhostname].idleTimeoutSecs == u'0':
 mythdb.settings.NULL.WakeupTimeFormat = u'yyyy-MM-ddThh:mm:ss'
 mythdb.settings.NULL.SetWakeuptimeCommand = u'/usr/bin/mythshutdown --setwakeup $time'
 mythdb.settings.NULL.ServerHaltCommand = u'/usr/bin/mythshutdown --shutdown'
-mythdb.settings.NULL.preSDWUCheckCommand = u'/usr/bin/mythshutdown --check'
+mythdb.settings.NULL.preSDWUCheckCommand = u'/usr/LH/bin/idle.sh -s -d'
-- 
cgit v0.12

