From 9f254340b1e440c35d8a591875cca9ac2e3318c5 Mon Sep 17 00:00:00 2001
From: Cecil <knoppmyth@gmail.com>
Date: Thu, 13 Jan 2011 20:43:48 -0800
Subject: tiacx:Fixed kernel dep.

---
 abs/core/tiacx/PKGBUILD | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

diff --git a/abs/core/tiacx/PKGBUILD b/abs/core/tiacx/PKGBUILD
index e4c7d02..6fa4980 100644
--- a/abs/core/tiacx/PKGBUILD
+++ b/abs/core/tiacx/PKGBUILD
@@ -3,14 +3,14 @@
 
 pkgname=tiacx
 pkgver=20080210
-pkgrel=18
+pkgrel=19
 pkgdesc="OpenSource module for Texas Instruments ACX100/ACX111 wireless chips. For stock arch 2.6 kernel"
 arch=(i686 x86_64)
 url="http://acx100.sourceforge.net/"
 license=('MPL')
 #depends=('wireless_tools' 'kernel26>=2.6.36' 'kernel26<2.6.37' 'tiacx-firmware')
 #makedepends=('kernel26-headers>=2.6.36' 'kernel26-headers<2.6.37')
-depends=('wireless_tools' 'kernel26>=2.6.37' 'tiacx-firmware')
+depends=('wireless_tools' 'kernel26<=2.6.37' 'tiacx-firmware')
 makedepends=('kernel26-headers>=2.6.37')
 install=acx.install
 source=(http://downloads.sourceforge.net/sourceforge/acx100/acx-$pkgver.tar.bz2
-- 
cgit v0.12

