From f4ba26ee1b5275b4c5af949fccfaf4845e205d65 Mon Sep 17 00:00:00 2001
From: Britney Fransen <brfransen@gmail.com>
Date: Sat, 27 Jan 2024 11:27:26 -0500
Subject: linhes-system: lh_system_start.sh: disable kde DPMS idle time

---
 linhes/linhes-system/PKGBUILD           | 4 ++--
 linhes/linhes-system/lh_system_start.sh | 1 +
 2 files changed, 3 insertions(+), 2 deletions(-)

diff --git a/linhes/linhes-system/PKGBUILD b/linhes/linhes-system/PKGBUILD
index 3958382..173baf0 100755
--- a/linhes/linhes-system/PKGBUILD
+++ b/linhes/linhes-system/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=linhes-system
 pkgver=9.0.0
-pkgrel=67
+pkgrel=68
 arch=('x86_64')
 #install=$pkgname.install
 pkgdesc="Everything that makes LinHES a system"
@@ -33,7 +33,7 @@ sha256sums=('e6eaa2fb4819fa60cb05b4d2e7328d2914af3a73028a735ec4d56e7ece33ecc0'
             '8b54c31b8efde3917f603c5307bebb0a2a00239ad9a983c2f5d8120003256449'
             'ae34515e144830f424d3bd3f6b1b446892d62beed20bca6f0fb19b0bbb779f27'
             '5e6d128f879b0fe7c1a190cccd75d4e5d00afc161f3bc9e92ffa2d87242cc9df'
-            '22c28459bdd24fdba89823140553c47041e372336fc7c503b53fd84de460233b'
+            '0e1a8bfb874d88e28c60fe37e7c2f769d6f196c0d62e1108ffada851acfc8575'
             '6d4fb0ed1a5ed961b3a3884dce093118e50c2981a9cd5837d20abc5a6d4fd8aa'
             '87875d9e5f5ce18208f419698ce69b6bcbcd08955a57a4a13940e715af58b787'
             '93d664f4a46fda05d0f754d19df40cbda120e325b80c07092345b14763993833'
diff --git a/linhes/linhes-system/lh_system_start.sh b/linhes/linhes-system/lh_system_start.sh
index 6a8f6b1..1a6264a 100755
--- a/linhes/linhes-system/lh_system_start.sh
+++ b/linhes/linhes-system/lh_system_start.sh
@@ -26,6 +26,7 @@ function applyUIsettings(){
     kwriteconfig5 --file ~/.config/kscreenlockerrc --group Daemon --key Autolock false
     kwriteconfig5 --file ~/.config/kscreenlockerrc --group Daemon --key LockOnResume false
     kwriteconfig5 --file ~/.config/ksmserverrc --group General --key loginMode emptySession
+    kwriteconfig5 --file ~/.powermanagementprofilesrc --group AC --group DPMSControl --key idleTime --delete
     #disable file indexing
     balooctl disable
     sleep 2
-- 
cgit v0.12

