From 251aa67903af196b8cfe6eac0ff04a37a456238d Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Tue, 4 Dec 2012 15:43:03 -0600
Subject: runit-scripts: move folding_at_home scripts to  runitscripts
 Configuration of FAH was moved to the run script so it no longer needs or
 uses config.xml However  if /etc/fah-config.xml is present it will use it and
 skip using values from /etc/systemconfig

refs #872
---
 abs/core/runit-scripts/PKGBUILD                    |  2 +-
 .../runit-scripts/runitscripts/services/fah/finish | 16 +++++++++++++
 .../runit-scripts/runitscripts/services/fah/run    | 27 ++++++++++++++++++++++
 3 files changed, 44 insertions(+), 1 deletion(-)
 create mode 100755 abs/core/runit-scripts/runitscripts/services/fah/finish
 create mode 100644 abs/core/runit-scripts/runitscripts/services/fah/run

diff --git a/abs/core/runit-scripts/PKGBUILD b/abs/core/runit-scripts/PKGBUILD
index 47ffd97..970f927 100755
--- a/abs/core/runit-scripts/PKGBUILD
+++ b/abs/core/runit-scripts/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=runit-scripts
 pkgver=2.1.1
-pkgrel=89
+pkgrel=90
 pkgdesc="collection of startup scripts for runit"
 url="http://smarden.org/runit/"
 license="BSD"
diff --git a/abs/core/runit-scripts/runitscripts/services/fah/finish b/abs/core/runit-scripts/runitscripts/services/fah/finish
new file mode 100755
index 0000000..9385e7c
--- /dev/null
+++ b/abs/core/runit-scripts/runitscripts/services/fah/finish
@@ -0,0 +1,16 @@
+#!/bin/bash
+export TERM=linux
+. /etc/rc.conf
+. /etc/rc.d/functions
+
+
+[ -e /etc/sv/fah/.runtime ] || mkdir -p /etc/sv/fah/.runtime
+touch /etc/sv/fah/.runtime/`date +%s`
+numfiles=`/usr/bin/file_time_offset.py   -s4 -d/etc/sv/fah/.runtime `
+if [ $numfiles -gt 3 ]
+then
+	 rm -f /etc/sv/fah/.runtime/* 2>/dev/null
+	 sv stop fah
+	 printhl "    folding@home is not able to start, disabling it"
+fi
+
diff --git a/abs/core/runit-scripts/runitscripts/services/fah/run b/abs/core/runit-scripts/runitscripts/services/fah/run
new file mode 100644
index 0000000..1a3b8a6
--- /dev/null
+++ b/abs/core/runit-scripts/runitscripts/services/fah/run
@@ -0,0 +1,27 @@
+#!/bin/sh
+export TERM=linux
+. /etc/rc.conf
+. /etc/rc.d/functions
+configfile=/etc/fah-config.xml
+. /etc/systemconfig
+FOLDING_DIR=/data/storage/disk0/media/foldingathome/$hostname
+mkdir -p $FOLDING_DIR
+chown mythtv:mythtv $FOLDING_DIR
+
+if [ -d $FOLDING_DIR ]
+then
+    cd $FOLDING_DIR
+    if [ -e $configfile ]
+    then
+        stat_runit "Starting folding@home with $configfile"
+        exec /opt/fah-v7/FAHClient --config $configfile 2>&1 > /dev/null
+    else
+        stat_runit "Starting folding@home"
+
+            /opt/fah-v7/FAHClient --run-as mythtv\
+                            --team=50975\
+                            --user=${foldingusername}\
+                            --max-packet-size=${foldingworksize} 2>&1 > /dev/null
+
+    fi
+fi
\ No newline at end of file
-- 
cgit v0.12

