From 32a740e2acc7676085250ea77557c3787e7ace2c Mon Sep 17 00:00:00 2001
From: Britney Fransen <brfransen@gmail.com>
Date: Mon, 10 Mar 2014 14:16:27 +0000
Subject: poweroff-scripts: change shutdown messages

---
 abs/core/poweroff-scripts/PKGBUILD        | 12 ++++++------
 abs/core/poweroff-scripts/halt.script     |  2 +-
 abs/core/poweroff-scripts/poweroff.script |  2 +-
 abs/core/poweroff-scripts/shutdown.script |  2 +-
 4 files changed, 9 insertions(+), 9 deletions(-)

diff --git a/abs/core/poweroff-scripts/PKGBUILD b/abs/core/poweroff-scripts/PKGBUILD
index ff32494..e5cab49 100644
--- a/abs/core/poweroff-scripts/PKGBUILD
+++ b/abs/core/poweroff-scripts/PKGBUILD
@@ -1,9 +1,9 @@
 pkgname=poweroff-scripts
 pkgver=1.1
-pkgrel=4
+pkgrel=5
 pkgdesc="replacement scripts to work with sysvinit and runit"
 license=('GPL')
-depends=('sysvinit>=2.88' 'runit>=2.1.1-6')
+depends=('systemd-sysvcompat' 'runit>=2.1.1-6')
 makedepends=()
 conflicts=()
 replaces=()
@@ -21,7 +21,7 @@ package() {
 
 }
 
-md5sums=('68ac5d7d5784e9559c9752d94a4943d5'
-         '3e042113f8715bc5bfd365d2486d0108'
-         '3ec5f3013dcbd60b6b957d17ba220585'
-         '1dccfcd2283d4ed193511535b0b220fc')
+md5sums=('a3538350e5c8e65a1418d9f1b5ff83c1'
+         'c9cbd22b341cf9e566eeedba7e51ecd2'
+         '58c374b2cacabac6728bb09c24e512a5'
+         'c151f7a35acc0db524c290be7594f09e')
diff --git a/abs/core/poweroff-scripts/halt.script b/abs/core/poweroff-scripts/halt.script
index 51c9925..b2e8170 100755
--- a/abs/core/poweroff-scripts/halt.script
+++ b/abs/core/poweroff-scripts/halt.script
@@ -10,7 +10,7 @@ INIT=`ps -p 1 -o comm=`
 
 if [ x$INIT = xrunit ]
 then
-    echo "System whill shutdown NOW" |wall
+    echo "System will shutdown NOW" |wall
     chvt 1
     runit-init 0
 
diff --git a/abs/core/poweroff-scripts/poweroff.script b/abs/core/poweroff-scripts/poweroff.script
index 211c9ee..2236983 100644
--- a/abs/core/poweroff-scripts/poweroff.script
+++ b/abs/core/poweroff-scripts/poweroff.script
@@ -5,7 +5,7 @@ INIT=`ps -p 1 -o comm=`
 chvt 1
 if [ x$INIT = xrunit ]
 then
-    echo "System whill shutdown NOW" |wall
+    echo "System will shutdown NOW" |wall
     chvt 1
     runit-init 0
 else
diff --git a/abs/core/poweroff-scripts/shutdown.script b/abs/core/poweroff-scripts/shutdown.script
index 978f7a2..b87b52f 100644
--- a/abs/core/poweroff-scripts/shutdown.script
+++ b/abs/core/poweroff-scripts/shutdown.script
@@ -36,7 +36,7 @@ then
 
 	if [ x$halt = x1 ]
 	then
-                echo "System will poweroff  in $delay seconds" | wall
+                echo "System will poweroff in $delay seconds" | wall
                 sleep $delay
                /sbin/runit-init 0
 	fi
-- 
cgit v0.12

