From 3ec5ecd6751d34076601560814ec2a82d3ad0702 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Wed, 5 Dec 2012 10:42:07 -0600
Subject: mysql:  removed binary logging from my.cnf These files can get rather
 large and eat up all the space on the database partition.

refs #874
---
 abs/core/mysql/PKGBUILD    | 4 ++--
 abs/core/mysql/__changelog | 3 ++-
 abs/core/mysql/my.cnf      | 4 ++--
 3 files changed, 6 insertions(+), 5 deletions(-)

diff --git a/abs/core/mysql/PKGBUILD b/abs/core/mysql/PKGBUILD
index 5d9cbb7..17850bd 100755
--- a/abs/core/mysql/PKGBUILD
+++ b/abs/core/mysql/PKGBUILD
@@ -5,7 +5,7 @@
 pkgbase=mysql
 pkgname=('libmysqlclient' 'mysql-clients' 'mysql')
 pkgver=5.5.28
-pkgrel=1
+pkgrel=2
 arch=('i686' 'x86_64')
 license=('GPL')
 url="https://www.mysql.com/products/community/"
@@ -127,7 +127,7 @@ package_mysql(){
 }
 md5sums=('da8ddb3d00e6e159153d2444360f52a8'
          'e7eb2faeab755cbb2fe03542bf328da9'
-         '698827c2380bd5f831f2b8160cee4cae'
+         'e0f0c53cb6e3cead8896fa1f0c902789'
          '6ea6ceb360d09a774e87335ee098ddd5'
          '2fa6e456964d4ff5e6d4f9ff0126aed6'
          'a0e1460c276a50a9666c331de83271f2')
diff --git a/abs/core/mysql/__changelog b/abs/core/mysql/__changelog
index 6aac3a6..ec41d21 100644
--- a/abs/core/mysql/__changelog
+++ b/abs/core/mysql/__changelog
@@ -1 +1,2 @@
-data dir  /data/srv/mysql
\ No newline at end of file
+data dir  /data/srv/mysql
+removed binary logging
diff --git a/abs/core/mysql/my.cnf b/abs/core/mysql/my.cnf
index 457a750..6d24cfa 100755
--- a/abs/core/mysql/my.cnf
+++ b/abs/core/mysql/my.cnf
@@ -54,10 +54,10 @@ join_buffer_size = 128K
 
 # Replication Master Server (default)
 # binary logging is required for replication
-log-bin=mysql-bin
+#log-bin=mysql-bin
 
 # binary logging format - mixed recommended
-binlog_format=mixed
+#binlog_format=mixed
 
 # required unique id between 1 and 2^32 - 1
 # defaults to 1 if master-host is not set
-- 
cgit v0.12

