From 98ccc35a989a9b5ac056d5113346e9f979eab88d Mon Sep 17 00:00:00 2001
From: Britney Fransen <brfransen@gmail.com>
Date: Tue, 1 Oct 2013 14:39:10 -0500
Subject: LinHES-system: misc_status_config.py: fix logging error

---
 abs/core/LinHES-system/PKGBUILD              | 4 ++--
 abs/core/LinHES-system/misc_status_config.py | 3 ++-
 2 files changed, 4 insertions(+), 3 deletions(-)

diff --git a/abs/core/LinHES-system/PKGBUILD b/abs/core/LinHES-system/PKGBUILD
index fddb3a7..6661028 100755
--- a/abs/core/LinHES-system/PKGBUILD
+++ b/abs/core/LinHES-system/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=LinHES-system
 pkgver=8.0
-pkgrel=27
+pkgrel=28
 arch=('i686' 'x86_64')
 install=system.install
 pkgdesc="Everything that makes LinHES an automated system"
@@ -107,7 +107,7 @@ md5sums=('5ee78704cab0e88ec58d1aab821fc1aa'
          'f3502bb7c665750da0ecdf6918f7c838'
          'b7febd04f64fe21e8cfbb888219b0b31'
          '06a628469051237943b7c874f2e29b8a'
-         '54ebcc024db2e0ebe8121305d8926767'
+         '8fe86aa9109a285aedce3c8658952bbb'
          '45f46d1f9193c8dde18e56369ec29a1e'
          '145b1da6ce501b3ce38ea415a576bf2d'
          '116b0f62ed4e8dd6e437930deeb6e49e'
diff --git a/abs/core/LinHES-system/misc_status_config.py b/abs/core/LinHES-system/misc_status_config.py
index cc82534..c9b8637 100755
--- a/abs/core/LinHES-system/misc_status_config.py
+++ b/abs/core/LinHES-system/misc_status_config.py
@@ -6,6 +6,7 @@ from socket import gethostname
 from MythTV import MythDB
 mythdb = MythDB()
 localhostname = gethostname()
+import sys
 
 # Function to set db setting.  This setting is set in mythtv-setup.
 def dbSettingChange():
@@ -23,7 +24,7 @@ file_name = "/etc/systemconfig"
 try:
     config_file = open(file_name)
 except:
-    logging.critical("%s could not be opened", file_name)
+    print file_name + " could not be opened"
     sys.exit(1)
 
 for line in config_file:
-- 
cgit v0.12

