From 98ce9d182b3c1a15c0cc33ec31ed6d13423b4b05 Mon Sep 17 00:00:00 2001
From: Britney Fransen <brfransen@gmail.com>
Date: Sun, 31 May 2020 00:38:55 +0000
Subject: glances: update to 3.1.4.1

---
 abs/extra/glances/NEWS.rst | 1204 ++++++++++++++++++++++++++++++++++++++++++++
 abs/extra/glances/PKGBUILD |   10 +-
 2 files changed, 1210 insertions(+), 4 deletions(-)
 create mode 100644 abs/extra/glances/NEWS.rst

diff --git a/abs/extra/glances/NEWS.rst b/abs/extra/glances/NEWS.rst
new file mode 100644
index 0000000..794be84
--- /dev/null
+++ b/abs/extra/glances/NEWS.rst
@@ -0,0 +1,1204 @@
+==============================================================================
+Glances Version 3
+==============================================================================
+
+Version 3.1.5
+=============
+
+Under development...
+
+Version 3.1.4
+=============
+
+Enhancements and new features:
+
+    * FS filtering can be done on device name documentation enhancement #1606
+    * Feature request: Include hostname in all (e.g. kafka) exports #1594
+    * Threading.isAlive was removed in Python 3.9. Use is_alive. #1585
+    * log file under public/shared tmp/ folders must not have deterministic name #1575
+    * Install / Systemd Debian documentation #1560
+    * Display load as percentage when Irix mode is disable #1554
+    * [WebUI] Add a new TCP connections status plugin new feature #1547
+    * Make processes.sort_key configurable enhancement #1536
+    * NVIDIA GPU temperature #1523
+    * Feature request: HDD S.M.A.R.T. #1288
+
+Bugs corrected:
+
+    * Glances 3.1.3: when no network interface with Public address #1615
+    * NameError: name 'logger' is not defined #1602
+    * Disk IO stats missing after upgrade to 5.5.x kernel #1601
+    * Glances don't want to run on Crostini (LXC Container, Debian 10, python 3.7.3) #1600
+    * Kafka key name needs to be bytes #1593
+    * Cant start glances with glances --export mqtt #1581
+    * [WEBUI] AMP plugins is not displayed correctly in the Web Interface #1574
+    * Unhandled AttributeError when no config files found #1569
+    * Glances writing lots of Docker Error message in logs file enhancement #1561
+    * GPU stats not showing on mobile web view bug needs test #1555
+    * KeyError: b'Rss:' in memory_maps #1551
+    * CPU usage is always 100% #1550
+    * IP plugin still exporting data when disabled #1544
+    * Quicklook plugin not working on Systemd #1537
+
+Version 3.1.3
+=============
+
+Enhancements and new features:
+
+  * Add a new TCP connections status plugin enhancement #1526
+  * Add --enable-plugin option from the command line
+
+Bugs corrected:
+
+  * Fix custom refresh time in the web UI #1548 by notFloran
+  * Fix issue in WebUI with empty docker stats #1546 by notFloran
+  * Glances fails without network interface bug #1535
+  * Disable option in the configuration file is now take into account
+
+Others:
+
+  * Sensors plugin is disable by default (high CPU consumption on some Liux distribution).
+
+Version 3.1.2
+=============
+
+Enhancements and new features:
+
+  * Make CSV export append instead of replace #1525
+  * HDDTEMP config IP and Port #1508
+  * [Feature Request] Option in config to change character used to display percentage in Quicklook #1508
+
+Bugs corrected:
+  * Cannot restart glances with --export influxdb after update to 3.1.1 bug #1530
+  * ip plugin empty interface bug #1509
+  * Glances Snap doesn't run on Orange Pi Zero running Ubuntu Core 16 bug #1517
+  * Error with IP Plugin : object has no attribute bug #1528
+  * repair the problem that when running 'glances --stdout-csv amps' #1520
+  * Possible typo in glances_influxdb.py #1514
+
+Others:
+
+      * In debug mode (-d) all duration (init, update are now logged). Grep duration in log file.
+
+Version 3.1.1
+=============
+
+Enhancements and new features:
+
+    * Please add some sparklines! #1446
+    * Add Load Average (similar to Linux) on Windows #344
+    * Add authprovider for cassandra export (thanks to @EmilienMottet) #1395
+    * Curses's browser server list sorting added (thanks to @limfreee) #1396
+    * ElasticSearch: add date to index, unbreak object push (thanks to @genevera) #1438
+    * Performance issue with large folder #1491
+    * Can't connect to influxdb with https enabled #1497
+
+Bugs corrected:
+
+    * Fix Cassandra table name export #1402
+    * 500 Internal Server Error /api/3/network/interface_name #1401
+    * Connection to MQTT server failed : getaddrinfo() argument 2 must be integer or string #1450
+    * `l` keypress (hide alert log) not working after some time #1449
+    * Too less data using prometheus exporter #1462
+    * Getting an error when running with prometheus exporter #1469
+    * Stack trace when starts Glances on CentOS #1470
+    * UnicodeEncodeError: 'ascii' codec can't encode character u'\u25cf' - Raspbian stretch #1483
+    * Prometheus integration broken with latest prometheus_client #1397
+    * "sorted by ?" is displayed when setting the sort criterion to "USER" #1407
+    * IP plugin displays incorrect subnet mask #1417
+    * Glances PsUtil ValueError on IoCounter with TASK kernel options #1440
+    * Per CPU in Web UI have some display issues. #1494
+    * Fan speed and voltages section? #1398
+
+Others:
+
+    * Documentation is unclear how to get Docker information #1386
+    * Add 'all' target to the Pip install (install all dependencies)
+    * Allow comma separated commands in AMP
+
+Version 3.1
+===========
+
+Enhancements and new features:
+
+    * Add a CSV output format to the STDOUT output mode #1363
+    * Feature request: HDD S.M.A.R.T. reports (thanks to @tnibert) #1288
+    * Sort docker stats #1276
+    * Prohibit some plug-in data from being exported to influxdb #1368
+    * Disable plugin from Glances configuration file #1378
+    * Curses-browser's server list paging added (thanks to @limfreee) #1385
+    * Client Browser's thread management added (thanks to @limfreee) #1391
+
+Bugs corrected:
+
+    * TypeError: '<' not supported between instances of 'float' and 'str' #1315
+    * GPU plugin not exported to influxdb #1333
+    * Crash after running fine for several hours #1335
+    * Timezone listed doesn’t match system timezone, outputs wrong time #1337
+    * Compare issue with Process.cpu_times() #1339
+    * ERROR -- Can not grab extended stats (invalid attr name 'num_fds') #1351
+    * Action on port/web plugins is not working #1358
+    * Support for monochrome (serial) terminals e.g. vt220 #1362
+    * TypeError on opening (Wifi plugin) #1373
+    * Some field name are incorrect in CSV export #1372
+    * Standard output misbehaviour (need to flush) #1376
+    * Create an option to set the username to use in Web or RPC Server mode #1381
+    * Missing kernel task names when the webui is switched to long process names #1371
+    * Drive name with special characters causes crash #1383
+    * Cannot get stats in Cloud plugin (404) #1384
+
+Others:
+
+    * Add Docker documentation (thanks to @rgarrigue)
+    * Refactor Glances logs (now called Glances events)
+    * "chart" extra dep replace by "graph" #1389
+
+Version 3.0.2
+=============
+
+Bug corrected:
+
+    * Glances IO Errorno 22 - Invalid argument #1326
+
+Version 3.0.1
+=============
+
+Bug corrected:
+
+    *  AMPs error if no output are provided by the system call #1314
+
+Version 3.0
+===========
+
+See the release note here: https://github.com/nicolargo/glances/wiki/Glances-3.0-Release-Note
+
+Enhancements and new features:
+
+    * Make the left side bar width dynamic in the Curse UI #1177
+    * Add threads number in the process list #1259
+    * A way to have only REST API available and disable WEB GUI access #1149
+    * Refactor graph export plugin (& replace Matplolib by Pygal) #697
+    * Docker module doesn't export details about stopped containers #1152
+    * Add dynamic fields in all sections of the configuration file #1204
+    * Make plugins and export CLI option dynamical #1173
+    * Add a light mode for the console UI #1165
+    * Refactor InfluxDB (API is now stable) #1166
+    * Add deflate compression support to the RestAPI #1182
+    * Add a code of conduct for Glances project's participants #1211
+    * Context switches bottleneck identification #1212
+    * Take advantage of the psutil issue #1025 (Add process_iter(attrs, ad_value)) #1105
+    * Nice Process Priority Configuration #1218
+    * Display debug message if dep lib is not found #1224
+    * Add a new output mode to stdout #1168
+    * Huge refactor of the WebUI packaging thanks to @spike008t #1239
+    * Add time zone to the current time #1249
+    * Use HTTPs URLs to check public IP address #1253
+    * Add labels support to Promotheus exporter #1255
+    * Overlap in Web UI when monitoring a machine with 16 cpu threads #1265
+    * Support for exporting data to a MQTT server #1305
+
+    One more thing ! A new Grafana Dash is available with:
+    * Network interface variable
+    * Disk variable
+    * Container CPU
+
+Bugs corrected:
+
+    * Crash in the Wifi plugin on my Laptop #1151
+    * Failed to connect to bus: No such file or directory #1156
+    * glances_plugin.py has a problem with specific docker output #1160
+    * Key error 'address' in the IP plugin #1176
+    * NameError: name 'mode' is not defined in case of interrupt shortly after starting the server mode #1175
+    * Crash on startup: KeyError: 'hz_actual_raw' on Raspbian 9.1 #1170
+    * Add missing mount-observe and system-observe interfaces #1179
+    * OS specific arguments should be documented and reported #1180
+    * 'ascii' codec can't encode character u'\U0001f4a9' in position 4: ordinal not in range(128) #1185
+    * KeyError: 'memory_info' on stats sum #1188
+    * Electron/Atom processes displayed wrong in process list #1192
+    * Another encoding issue... With both Python 2 and Python 3 #1197
+    * Glances do not exit when eating 'q' #1207
+    * FreeBSD blackhole bug #1202
+    * Glances crashes when mountpoint with non ASCII characters exists #1201
+    * [WEB UI] Minor issue on the Web UI #1240
+    * [Glances 3.0 RC1] Client/Server is broken #1244
+    * Fixing horizontal scrolling #1248
+    * Stats updated during export (thread issue) #1250
+    * Glances --browser crashed when more than 40 glances servers on screen 78x45 #1256
+    * OSX - Python 3 and empty percent and res #1251
+    * Crashes when influxdb option set #1260
+    * AMP for kernel process is not working #1261
+    * Arch linux package (2.11.1-2) psutil (v5.4.1): RuntimeWarning: ignoring OSError #1203
+    * Glances crash with extended process stats #1283
+    * Terminal window stuck at the last accessed *protected* server #1275
+    * Glances shows mdadm RAID0 as degraded when chunksize=128k and the array isn't degraded. #1299
+    * Never starts in a server on Google Cloud and FreeBSD #1292
+
+Backward-incompatible changes:
+
+    * Support for Python 3.3 has been dropped (EOL 2017-09-29)
+    * Support for psutil < 5.3.0 has been dropped
+    * Minimum supported Docker API version is now 1.21 (Docker plugins)
+    * Support for InfluxDB < 0.9 is deprecated (InfluxDB exporter)
+    * Zeroconf lib should be pinned to 0.19.1 for Python 2.x
+    * --disable-<plugin> no longer available (use --disable-plugin <plugin>)
+    * --export-<exporter> no longer available (use --export <exporter>)
+
+News command line options:
+
+    --disable-webui  Disable the WebUI (only RESTful API will respond)
+    --enable-light   Enable the light mode for the UI interface
+    --modules-list   Display plugins and exporters list
+    --disable-plugin plugin1,plugin2
+                     Disable a list of comma separated plugins
+    --export exporter1,exporter2
+                     Export stats to a comma separated exporters
+    --stdout plugin1,plugin2.attribute
+                     Display stats to stdout
+
+News configuration keys in the glances.conf file:
+
+Graph:
+
+    [graph]
+    # Configuration for the --export graph option
+    # Set the path where the graph (.svg files) will be created
+    # Can be overwrite by the --graph-path command line option
+    path=/tmp
+    # It is possible to generate the graphs automatically by setting the
+    # generate_every to a non zero value corresponding to the seconds between
+    # two generation. Set it to 0 to disable graph auto generation.
+    generate_every=60
+    # See followings configuration keys definitions in the Pygal lib documentation
+    # http://pygal.org/en/stable/documentation/index.html
+    width=800
+    height=600
+    style=DarkStyle
+
+Processes list Nice value:
+
+    [processlist]
+    # Nice priorities range from -20 to 19.
+    # Configure nice levels using a comma separated list.
+    #
+    # Nice: Example 1, non-zero is warning (default behavior)
+    nice_warning=-20,-19,-18,-17,-16,-15,-14,-13,-12,-11,-10,-9,-8,-7,-6,-5,-4,-3,-2,-1,1,2,3,4,5,6,7,8,9,10,11,12,13,14,15,16,17,18,19
+    #
+    # Nice: Example 2, low priority processes escalate from careful to critical
+    #nice_careful=1,2,3,4,5,6,7,8,9
+    #nice_warning=10,11,12,13,14
+    #nice_critical=15,16,17,18,19
+
+Docker plugin (related to #1152)
+
+    [docker]
+    # By default, Glances only display running containers
+    # Set the following key to True to display all containers
+    all=False
+
+All configuration file values (related to #1204)
+
+    [influxdb]
+    # It is possible to use dynamic system command
+    prefix=`hostname`
+    tags=foo:bar,spam:eggs,system:`uname -a`
+
+==============================================================================
+Glances Version 2
+==============================================================================
+
+Version 2.11.1
+==============
+
+    * [WebUI] Sensors not showing on Web (issue #1142)
+    * Client and Quiet mode don't work together (issue #1139)
+
+Version 2.11
+============
+
+Enhancements and new features:
+
+    * New export plugin: standard and configurable RESTful exporter (issue #1129)
+    * Add a JSON export module (issue #1130)
+    * [WIP] Refactoring of the WebUI
+
+Bugs corrected:
+
+    * Installing GPU plugin crashes entire Glances (issue #1102)
+    * Potential memory leak in Windows WebUI (issue #1056)
+    * glances_network `OSError: [Errno 19] No such device` (issue #1106)
+    * GPU plugin. <class 'TypeError'>: ... not JSON serializable"> (issue #1112)
+    * PermissionError on macOS (issue #1120)
+    * Cant move up or down in glances --browser (issue #1113)
+    * Unable to give aliases to or hide network interfaces and disks (issue #1126)
+    * `UnicodeDecodeError` on mountpoints with non-breaking spaces (issue #1128)
+
+Installation:
+
+    * Create a Snap of Glances (issue #1101)
+
+Version 2.10
+============
+
+Enhancements and new features:
+
+    * New plugin to scan remote Web sites (URL) (issue #981)
+    * Add trends in the Curses interface (issue #1077)
+    * Add new repeat function to the action (issue #952)
+    * Use -> and <- arrows keys to switch between processing sort (issue #1075)
+    * Refactor __init__ and main scripts (issue #1050)
+    * [WebUI] Improve WebUI for Windows 10 (issue #1052)
+
+Bugs corrected:
+
+    * StatsD export prefix option is ignored (issue #1074)
+    * Some FS and LAN metrics fail to export correctly to StatsD (issue #1068)
+    * Problem with non breaking space in file system name (issue #1065)
+    * TypeError: string indices must be integers (Network plugin) (issue #1054)
+    * No Offline status for timeouted ports? (issue #1084)
+    * When exporting, uptime values loop after 1 day (issue #1092)
+
+Installation:
+
+  * Create a package.sh script to generate .DEB, .RPM and others... (issue #722)
+  ==> https://github.com/nicolargo/glancesautopkg
+  * OSX: can't python setup.py install due to python 3.5 constraint (issue #1064)
+
+Version 2.9.1
+=============
+
+Bugs corrected:
+
+    * Glances PerCPU issues with Curses UI on Android (issue #1071)
+    * Remove extra } in format string (issue #1073)
+
+Version 2.9.0
+=============
+
+Enhancements and new features:
+
+    * Add a Prometheus export module (issue #930)
+    * Add a Kafka export module (issue #858)
+    * Port in the -c URI (-c hostname:port) (issue #996)
+
+Bugs corrected:
+
+    * On Windows --export-statsd terminates immediately and does not export (issue #1067)
+    * Glances v2.8.7 issues with Curses UI on Android (issue #1053)
+    * Fails to start, OSError in sensors_temperatures (issue #1057)
+    * Crashs after long time running the glances --browser (issue #1059)
+    * Sensor values don't refresh since psutil backend (issue #1061)
+    * glances-version.db Permission denied (issue #1066)
+
+Version 2.8.8
+=============
+
+Bugs corrected:
+
+    * Drop requests to check for outdated Glances version
+    * Glances cannot load "Powersupply" (issue #1051)
+
+Version 2.8.7
+=============
+
+Bugs corrected:
+
+    * Windows OS - Global name standalone not defined again (issue #1030)
+
+Version 2.8.6
+=============
+
+Bugs corrected:
+
+    * Windows OS - Global name standalone not defined (issue #1030)
+
+Version 2.8.5
+=============
+
+Bugs corrected:
+
+    * Cloud plugin error: Name 'requests' is not defined (issue #1047)
+
+Version 2.8.4
+=============
+
+Bugs corrected:
+
+    * Correct issue on Travis CI test
+
+Version 2.8.3
+=============
+
+Enhancements and new features:
+
+    * Use new sensors-related APIs of psutil 5.1.0 (issue #1018)
+    * Add a "Cloud" plugin to grab stats inside the AWS EC2 API (issue #1029)
+
+Bugs corrected:
+
+    * Unable to launch Glances on Windows (issue #1021)
+    * Glances --export-influxdb starts Webserver (issue #1038)
+    * Cut mount point name if it is too long (issue #1045)
+    * TypeError: string indices must be integers in per cpu (issue #1027)
+    * Glances crash on RPi 1 running ArchLinuxARM (issue #1046)
+
+Version 2.8.2
+=============
+
+Bugs corrected:
+
+    * InfluxDB export in 2.8.1 is broken (issue #1026)
+
+Version 2.8.1
+=============
+
+Enhancements and new features:
+
+    * Enable docker plugin on Windows (issue #1009) - Thanks to @fraoustin
+
+Bugs corrected:
+
+    * Glances export issue with CPU and SENSORS (issue #1024)
+    * Can't export data to a CSV file in Client/Server mode (issue #1023)
+    * Autodiscover error while binding on IPv6 addresses (issue #1002)
+    * GPU plugin is display when hitting '4' or '5' shortkeys (issue #1012)
+    * Interrupts and usb_fiq (issue #1007)
+    * Docker image does not work in web server mode! (issue #1017)
+    * IRQ plugin is not display anymore (issue #1013)
+    * Autodiscover error while binding on IPv6 addresses (issue #1002)
+
+Version 2.8
+===========
+
+Changes:
+
+    * The curses interface on Windows is no more. The web-based interface is now
+      the default. (issue #946)
+    * The name of the log file now contains the name of the current user logged in,
+      i.e., 'glances-USERNAME.log'.
+    * IRQ plugin off by default. '--disable-irq' option replaced by '--enable-irq'.
+
+Enhancements and new features:
+
+    * GPU monitoring (limited to NVidia) (issue #170)
+    * WebUI CPU consumption optimization (issue #836)
+    * Not compatible with the new Docker API 2.0 (Docker 1.13) (issue #1000)
+    * Add ZeroMQ exporter (issue #939)
+    * Add CouchDB exporter (issue #928)
+    * Add hotspot Wifi informations (issue #937)
+    * Add default interface speed and automatic rate thresolds (issue #718)
+    * Highlight max stats in the processes list (issue #878)
+    * Docker alerts and actions (issue #875)
+    * Glances API returns the processes PPID (issue #926)
+    * Configure server cached time from the command line --cached-time (issue #901)
+    * Make the log logger configurable (issue #900)
+    * System uptime in export (issue #890)
+    * Refactor the --disable-* options (issue #948)
+    * PID column too small if kernel.pid_max is > 99999 (issue #959)
+
+Bugs corrected:
+
+    * Glances RAID plugin Traceback (issue #927)
+    * Default AMP crashes when 'command' given (issue #933)
+    * Default AMP ignores `enable` setting (issue #932)
+    * /proc/interrupts not found in an OpenVZ container (issue #947)
+
+Version 2.7.1
+=============
+
+Bugs corrected:
+
+    * AMP plugin crashs on start with Python 3 (issue #917)
+    * Ports plugin crashs on start with Python 3 (issue #918)
+
+Version 2.7
+===========
+
+Backward-incompatible changes:
+
+    * Drop support for Python 2.6 (issue #300)
+
+Deprecated:
+
+    * Monitoring process list module is replaced by AMP (see issue #780)
+    * Use --export-graph instead of --enable-history (issue #696)
+    * Use --path-graph instead of --path-history (issue #696)
+
+Enhancements and new features:
+
+    * Add Application Monitoring Process plugin (issue #780)
+    * Add a new "Ports scanner" plugin (issue #734)
+    * Add a new IRQ monitoring plugin (issue #911)
+    * Improve IP plugin to display public IP address (issue #646)
+    * CPU additionnal stats monitoring: Context switch, Interrupts... (issue #810)
+    * Filter processes by others stats (username) (issue #748)
+    * [Folders] Differentiate permission issue and non-existence of a directory (issue #828)
+    * [Web UI] Add cpu name in quicklook plugin (issue #825)
+    * Allow theme to be set in configuration file (issue #862)
+    * Display a warning message when Glances is outdated (issue #865)
+    * Refactor stats history and export to graph. History available through API (issue #696)
+    * Add Cassandra/Scylla export plugin (issue #857)
+    * Huge pull request by Nicolas Hart to optimize the WebUI (issue #906)
+    * Improve documentation: http://glances.readthedocs.io (issue #872)
+
+Bugs corrected:
+
+    * Crash on launch when viewing temperature of laptop HDD in sleep mode (issue #824)
+    * [Web UI] Fix folders plugin never displayed (issue #829)
+    * Correct issue IP plugin: VPN with no internet access (issue #842)
+    * Idle process is back on FreeBSD and Windows (issue #844)
+    * On Windows, Glances try to display unexisting Load stats (issue #871)
+    * Check CPU info (issue #881)
+    * Unicode error on processlist on Windows server 2008 (french) (issue #886)
+    * PermissionError/OSError when starting glances (issue #885)
+    * Zeroconf problem with zeroconf_type = "_%s._tcp." % __appname__ (issue #888)
+    * Zeroconf problem with zeroconf service name (issue #889)
+    * [WebUI] Glances will not get past loading screen - Windows OS (issue #815)
+    * Improper bytes/unicode in glances_hddtemp.py (issue #887)
+    * Top 3 processes are back in the alert summary
+
+Code quality follow up: from 5.93 to 6.24 (source: https://scrutinizer-ci.com/g/nicolargo/glances)
+
+Version 2.6.2
+=============
+
+Bugs corrected:
+
+    * Crash with Docker 1.11 (issue #848)
+
+Version 2.6.1
+=============
+
+Enhancements and new features:
+
+    * Add a connector to Riemann (issue #822 by Greogo Nagy)
+
+Bugs corrected:
+
+    * Browsing for servers which are in the [serverlist] is broken (issue #819)
+    * [WebUI] Glances will not get past loading screen (issue #815) opened 9 days ago
+    * Python error after upgrading from 2.5.1 to 2.6 bug (issue #813)
+
+Version 2.6
+===========
+
+Deprecations:
+
+    * Add deprecation warning for Python 2.6.
+      Python 2.6 support will be dropped in future releases.
+      Please switch to at least Python 2.7 or 3.3+ as soon as possible.
+      See http://www.snarky.ca/stop-using-python-2-6 for more information.
+
+Enhancements and new features:
+
+    * Add a connector to ElasticSearch (welcome to Kibana dashboard) (issue #311)
+    * New folders' monitoring plugins (issue #721)
+    * Use wildcard (regexp) to the hide configuration option for network, diskio and fs sections (issue #799 )
+    * Command line arguments are now take into account in the WebUI (#789 by  @notFloran)
+    * Change username for server and web server authentication (issue #693)
+    * Add an option to disable top menu (issue #766)
+    * Add IOps in the DiskIO plugin (issue #763)
+    * Add hide configuration key for FS Plugin (issue #736)
+    * Add process summary min/max stats (issue #703)
+    * Add timestamp to the CSV export module (issue #708)
+    * Add a shortcut 'E' to delete process filter (issue #699)
+    * By default, hide disk I/O ram1-** (issue #714)
+    * When Glances is starting the notifications should be delayed (issue #732)
+    * Add option (--disable-bg) to disable ANSI background colours (issue #738 by okdana)
+    * [WebUI] add "pointer" cursor for sortable columns (issue #704 by @notFloran)
+    * [WebUI] Make web page title configurable (issue #724)
+    * Do not show interface in down state (issue #765)
+    * InfluxDB > 0.9.3 needs float and not int for numerical value (issue#749 and issue#750 by nicolargo)
+
+Bugs corrected:
+
+    * Can't read sensors on a Thinkpad (issue #711)
+    * InfluxDB/OpenTSDB: tag parsing broken (issue #713)
+    * Grafana Dashboard outdated for InfluxDB 0.9.x (issue #648)
+    * '--tree' breaks process filter on Debian 8 (issue #768)
+    * Fix highlighting of process when it contains whitespaces (issue #546 by Alessio Sergi)
+    * Fix RAID support in Python 3 (issue #793 by Alessio Sergi)
+    * Use dict view objects to avoid issue (issue #758 by Alessio Sergi)
+    * System exit if Cpu not supported by the Cpuinfo lib (issue #754 by nicolargo)
+    * KeyError: 'cpucore' when exporting data to InfluxDB (issue #729) by nicolargo)
+
+Others:
+    * A new Glances docker container to monitor your Docker infrastructure is available here (issue #728): https://hub.docker.com/r/nicolargo/glances/
+    * Documentation is now generated automatically thanks to Sphinx and the Alessio Sergi patch (https://glances.readthedocs.io/en/latest/)
+
+Contributors summary:
+    * Nicolas Hennion: 112 commits
+    * Alessio Sergi: 55 commits
+    * Floran Brutel: 19 commits
+    * Nicolas Hart: 8 commits
+    * @desbma: 4 commits
+    * @dana: 2 commits
+    * Damien Martin, Raju Kadam, @georgewhewell: 1 commit
+
+Version 2.5.1
+=============
+
+Bugs corrected:
+
+    * Unable to unlock password protected servers in browser mode bug (issue #694)
+    * Correct issue when Glances is started in console on Windows OS
+    * [WebUI] when alert is ongoing hide level enhancement (issue #692)
+
+Version 2.5
+===========
+
+Enhancements and new features:
+
+    * Allow export of Docker and sensors plugins stats to InfluxDB, StatsD... (issue #600)
+    * Docker plugin shows IO and network bitrate (issue #520)
+    * Server password configuration for the browser mode (issue #500)
+    * Add support for OpenTSDB export (issue #638)
+    * Add additional stats (iowait, steal) to the perCPU plugin (issue #672)
+    * Support Fahrenheit unit in the sensor plugin using the --fahrenheit command line option (issue #620)
+    * When a process filter is set, display sum of CPU, MEM... (issue #681)
+    * Improve the QuickLookplugin by adding hardware CPU info (issue #673)
+    * WebUI display a message if server is not available (issue #564)
+    * Display an error if export is not used in the standalone/client mode (issue #614)
+    * New --disable-quicklook, --disable-cpu, --disable-mem, --disable-swap, --disable-load tags (issue #631)
+    * Complete refactoring of the WebUI thanks to the (awesome) Floran pull (issue #656)
+    * Network cumulative /combination feature available in the WebUI (issue #552)
+    * IRIX mode off implementation (issue#628)
+    * Short process name displays arguments (issue #609)
+    * Server password configuration for the browser mode (issue #500)
+    * Display an error if export is not used in the standalone/client mode (issue #614)
+
+Bugs corrected:
+
+    * The WebUI displays bad sensors stats (issue #632)
+    * Filter processes crashs with a bad regular expression pattern (issue #665)
+    * Error with IP plugin (issue #651)
+    * Crach with Docker plugin (issue #649)
+    * Docker plugin crashs with webserver mode (issue #654)
+    * Infrequently crashing due to assert (issue #623)
+    * Value for free disk space is counterintuative on ext file systems (issue #644)
+    * Try/catch for unexpected psutil.NoSuchProcess: process no longer exists (issue #432)
+    * Fatal error using Python 3.4 and Docker plugin bug (issue #602)
+    * Add missing new line before g man option (issue #595)
+    * Remove unnecessary type="text/css" for link (HTML5) (issue #595)
+    * Correct server mode issue when no network interface is available (issue #528)
+    * Avoid crach on olds kernels (issue #554)
+    * Avoid crashing if LC_ALL is not defined by user (issue #517)
+    * Add a disable HDD temperature option on the command line (issue #515)
+
+
+Version 2.4.2
+=============
+
+Bugs corrected:
+
+    * Process no longer exists (again) (issue #613)
+    * Crash when "top extended stats" is enabled on OS X (issue #612)
+    * Graphical percentage bar displays "?" (issue #608)
+    * Quick look doesn't work (issue #605)
+    * [Web UI] Display empty Battery sensors enhancement (issue #601)
+    * [Web UI] Per CPU plugin has to be improved (issue #566)
+
+Version 2.4.1
+=============
+
+Bugs corrected:
+
+    * Fatal error using Python 3.4 and Docker plugin bug (issue #602)
+
+Version 2.4
+===========
+
+Changes:
+
+    * Glances doesn't provide a system-wide configuration file by default anymore.
+      Just copy it in any of the supported locations. See glances-doc.html for
+      more information. (issue #541)
+    * The default key bindings have been changed to:
+      - 'u': sort processes by USER
+      - 'U': show cumulative network I/O
+    * No more translations
+
+Enhancements and new features:
+
+    * The Web user interface is now based on AngularJS (issue #473, #508, #468)
+    * Implement a 'quick look' plugin (issue #505)
+    * Add sort processes by USER (issue #531)
+    * Add a new IP information plugin (issue #509)
+    * Add RabbitMQ export module (issue #540 Thk to @Katyucha)
+    * Add a quiet mode (-q), can be useful using with export module
+    * Grab FAN speed in the Glances sensors plugin (issue #501)
+    * Allow logical mounts points in the FS plugin (issue #448)
+    * Add a --disable-hddtemp to disable HDD temperature module at startup (issue #515)
+    * Increase alert minimal delay to 6 seconds (issue #522)
+    * If the Curses application raises an exception, restore the terminal correctly (issue #537)
+
+Bugs corrected:
+
+    * Monitor list, all processes are take into account (issue #507)
+    * Duplicated --enable-history in the doc (issue #511)
+    * Sensors title is displayed if no sensors are detected (issue #510)
+    * Server mode issue when no network interface is available (issue #528)
+    * DEBUG mode activated by default with Python 2.6 (issue #512)
+    * Glances display of time trims the hours showing only minutes and seconds (issue #543)
+    * Process list header not decorating when sorting by command (issue #551)
+
+Version 2.3
+===========
+
+Enhancements and new features:
+
+    * Add the Docker plugin (issue #440) with per container CPU and memory monitoring (issue #490)
+    * Add the RAID plugin (issue #447)
+    * Add actions on alerts (issue #132). It is now possible to run action (command line) by triggers. Action could contain {{tag}} (Mustache) with stat value.
+    * Add InfluxDB export module (--export-influxdb) (issue #455)
+    * Add StatsD export module (--export-statsd) (issue #465)
+    * Refactor export module (CSV export option is now --export-csv). It is now possible to export stats from the Glances client mode (issue #463)
+    * The Web inteface is now based on Bootstrap / RWD grid (issue #417, #366 and #461) Thanks to Nicolas Hart @nclsHart
+    * It is now possible, through the configuration file, to define if an alarm should be logged or not (using the _log option) (issue #437)
+    * You can now set alarm for Disk IO
+    * API: add getAllLimits and getAllViews methods (issue #481) and allow CORS request (issue #479)
+    * SNMP client support NetApp appliance (issue #394)
+
+Bugs corrected:
+
+    *  R/W error with the glances.log file (issue #474)
+
+Other enhancement:
+
+    * Alert < 3 seconds are no longer displayed
+
+Version 2.2.1
+=============
+
+    * Fix incorrect kernel thread detection with --hide-kernel-threads (issue #457)
+    * Handle IOError exception if no /etc/os-release to use Glances on Synology DSM (issue #458)
+    * Check issue error in client/server mode (issue #459)
+
+Version 2.2
+===========
+
+Enhancements and new features:
+
+    * Add centralized curse interface with a Glances servers list to monitor (issue #418)
+    * Add processes tree view (--tree) (issue #444)
+    * Improve graph history feature (issue #69)
+    * Extended stats is disable by default (use --enable-process-extended to enable it - issue #430)
+    * Add a short key ('F') and a command line option (--fs-free-space) to display FS free space instead of used space (issue #411)
+    * Add a short key ('2') and a command line option (--disable-left-sidebar) to disable/enable the side bar (issue #429)
+    * Add CPU times sort short key ('t') in the curse interface (issue #449)
+    * Refactor operating system detection for GNU/Linux operating system
+    * Code optimization
+
+Bugs corrected:
+
+    * Correct a bug with Glances pip install --user (issue #383)
+    * Correct issue on battery stat update (issue #433)
+    * Correct issue on process no longer exist (issues #414 and #432)
+
+Version 2.1.2
+=============
+
+    Maintenance version (only needed for Mac OS X).
+
+Bugs corrected:
+
+    * Mac OS X: Error if Glances is not ran with sudo (issue #426)
+
+Version 2.1.1
+=============
+
+Enhancement:
+
+    * Automaticaly compute top processes number for the current screen (issue #408)
+    * CPU and Memory footprint optimization (issue #401)
+
+Bugs corrected:
+
+    * Mac OS X 10.9: Exception at start (issue #423)
+    * Process no longer exists (issue #421)
+    * Error with Glances Client with Python 3.4.1 (issue #419)
+    * TypeError: memory_maps() takes exactly 2 arguments (issue #413)
+    * No filesystem informations since Glances 2.0 bug enhancement (issue #381)
+
+Version 2.1
+===========
+
+    * Add user process filter feature
+      User can define a process filter pattern (as a regular expression).
+      The pattern could be defined from the command line (-f <pattern>)
+      or by pressing the ENTER key in the curse interface.
+      For the moment, process filter feature is only available in standalone mode.
+    * Add extended processes informations for top process
+      Top process stats availables: CPU affinity, extended memory information (shared, text, lib, datat, dirty, swap), open threads/files and TCP/UDP network sessions, IO nice level
+      For the moment, extended processes stats are only available in standalone mode.
+    * Add --process-short-name tag and '/' key to switch between short/command line
+    * Create a max_processes key in the configuration file
+      The goal is to reduce the number of displayed processes in the curses UI and
+      so limit the CPU footprint of the Glances standalone mode.
+      The API always return all the processes, the key is only active in the curses UI.
+      If the key is not define, all the processes will be displayed.
+      The default value is 20 (processes displayed).
+      For the moment, this feature is only available in standalone mode.
+    * Alias for network interfaces, disks and sensors
+      Users can configure alias from the Glances configuration file.
+    * Add Glances log message (in the /tmp/glances.log file)
+      The default log level is INFO, you can switch to the DEBUG mode using the -d option on the command line.
+    * Add RESTful API to the Web server mode
+      RESTful API doc: https://github.com/nicolargo/glances/wiki/The-Glances-RESTFULL-JSON-API
+    * Improve SNMP fallback mode for Cisco IOS, VMware ESXi
+    * Add --theme-white feature to optimize display for white background
+    * Experimental history feature (--enable-history option on the command line)
+      This feature allows users to generate graphs within the curse interface.
+      Graphs are available for CPU, LOAD and MEM.
+      To generate graph, click on the 'g' key.
+      To reset the history, press the 'r' key.
+      Note: This feature uses the matplotlib library.
+    * CI: Improve Travis coverage
+
+Bugs corrected:
+
+    * Quitting glances leaves a column layout to the current terminal (issue #392)
+    * Glances crashes with malformed UTF-8 sequences in process command lines (issue #391)
+    * SNMP fallback mode is not Python 3 compliant (issue #386)
+    * Trouble using batinfo, hddtemp, pysensors w/ Python (issue #324)
+
+
+Version 2.0.1
+=============
+
+Maintenance version.
+
+Bugs corrected:
+
+    * Error when displaying numeric process user names (#380)
+    * Display users without username correctly (#379)
+    * Bug when parsing configuration file (#378)
+    * The sda2 partition is not seen by glances (#376)
+    * Client crash if server is ended during XML request (#375)
+    * Error with the Sensors module on Debian/Ubuntu (#373)
+    * Windows don't view all processes (#319)
+
+Version 2.0
+===========
+
+    Glances v2.0 is not a simple upgrade of the version 1.x but a complete code refactoring.
+    Based on a plugins system, it aims at providing an easy way to add new features.
+    - Core defines the basics and commons functions.
+    - all stats are grabbed through plugins (see the glances/plugins source folder).
+    - also outputs methods (Curse, Web mode, CSV) are managed as plugins.
+
+    The Curse interface is almost the same than the version 1.7. Some improvements have been made:
+    - space optimisation for the CPU, LOAD and MEM stats (justified alignment)
+    - CPU:
+        . CPU stats are displayed as soon as Glances is started
+        . steal CPU alerts are no more logged
+    - LOAD:
+        . 5 min LOAD alerts are no more logged
+    - File System:
+        . Display the device name (if space is available)
+    - Sensors:
+        . Sensors and HDD temperature are displayed in the same block
+    - Process list:
+        . Refactor columns: CPU%, MEM%, VIRT, RES, PID, USER, NICE, STATUS, TIME, IO, Command/name
+        . The running processes status is highlighted
+        . The process name is highlighted in the command line
+
+    Glances 2.0 brings a brand new Web Interface. You can run Glances in Web server mode and
+    consult the stats directly from a standard Web Browser.
+
+    The client mode can now fallback to a simple SNMP mode if Glances server is not found on the remote machine.
+
+    Complete release notes:
+    * Cut ifName and DiskName if they are too long in the curses interface (by Nicolargo)
+    * Windows CLI is OK but early experimental (by Nicolargo)
+    * Add bitrate limits to the networks interfaces (by Nicolargo)
+    * Batteries % stats are now in the sensors list (by Nicolargo)
+    * Refactor the client/server password security: using SHA256 (by Nicolargo,
+      based on Alessio Sergi's example script)
+    * Refactor the CSV output (by Nicolargo)
+    * Glances client fallback to SNMP server if Glances one not found (by Nicolargo)
+    * Process list: Highlight running/basename processes (by Alessio Sergi)
+    * New Web server mode thk to the Bottle library (by Nicolargo)
+    * Responsive design for Bottle interface (by Nicolargo)
+    * Remove HTML output (by Nicolargo)
+    * Enable/disable for optional plugins through the command line (by Nicolargo)
+    * Refactor the API (by Nicolargo)
+    * Load-5 alert are no longer logged (by Nicolargo)
+    * Rename In/Out by Read/Write for DiskIO according to #339 (by Nicolargo)
+    * Migrate from pysensors to py3sensors (by Alessio Sergi)
+    * Migration to psutil 2.x (by Nicolargo)
+    * New plugins system (by Nicolargo)
+    * Python 2.x and 3.x compatibility (by Alessio Sergi)
+    * Code quality improvements (by Alessio Sergi)
+    * Refactor unitaries tests (by Nicolargo)
+    * Development now follow the git flow workflow (by Nicolargo)
+
+
+==============================================================================
+Glances Version 1
+==============================================================================
+
+Version 1.7.7
+=============
+
+    * Fix CVS export [issue #348]
+    * Adapt to psutil 2.1.1
+    * Compatibility with Python 3.4
+    * Improve German update
+
+Version 1.7.6
+=============
+
+    * Adapt to psutil 2.0.0 API
+    * Fixed psutil 0.5.x support on Windows
+    * Fix help screen in 80x24 terminal size
+    * Implement toggle of process list display ('z' key)
+
+Version 1.7.5
+=============
+
+    * Force the PyPI installer to use the psutil branch 1.x (#333)
+
+Version 1.7.4
+=============
+
+    * Add threads number in the task summary line (#308)
+    * Add system uptime (#276)
+    * Add CPU steal % to cpu extended stats (#309)
+    * You can hide disk from the IOdisk view using the conf file (#304)
+    * You can hide network interface from the Network view using the conf file
+    * Optimisation of CPU consumption (around ~10%)
+    * Correct issue #314: Client/server mode always asks for password
+    * Correct issue #315: Defining password in client/server mode doesn't work as intended
+    * Correct issue #316: Crash in client server mode
+    * Correct issue #318: Argument parser, try-except blocks never get triggered
+
+Version 1.7.3
+=============
+
+    * Add --password argument to enter the client/server password from the prompt
+    * Fix an issue with the configuration file path (#296)
+    * Fix an issue with the HTML template (#301)
+
+Version 1.7.2
+=============
+
+    * Console interface is now Microsoft Windows compatible (thk to @fraoustin)
+    * Update documentation and Wiki regarding the API
+    * Added package name for python sources/headers in openSUSE/SLES/SLED
+    * Add FreeBSD packager
+    * Bugs corrected
+
+Version 1.7.1
+=============
+
+    * Fix IoWait error on FreeBSD / Mac OS
+    * HDDTemp module is now Python v3 compatible
+    * Don't warn a process is not running if countmin=0
+    * Add PyPI badge on the README.rst
+    * Update documentation
+    * Add document structure for http://readthedocs.org
+
+Version 1.7
+===========
+
+    * Add monitored processes list
+    * Add hard disk temperature monitoring (thanks to the HDDtemp daemon)
+    * Add batteries capacities information (thanks to the Batinfo lib)
+    * Add command line argument -r toggles processes (reduce CPU usage)
+    * Add command line argument -1 to run Glances in per CPU mode
+    * Platform/architecture is more specific now
+    * XML-RPC server: Add IPv6 support for the client/server mode
+    * Add support for local conf file
+    * Add a uninstall script
+    * Add getNetTimeSinceLastUpdate() getDiskTimeSinceLastUpdate() and getProcessDiskTimeSinceLastUpdate() in the API
+    * Add more translation: Italien, Chinese
+    * and last but not least... up to 100 hundred bugs corrected / software and
+    * docs improvements
+
+Version 1.6.1
+=============
+
+    * Add per-user settings (configuration file) support
+    * Add -z/--nobold option for better appearance under Solarized terminal
+    * Key 'u' shows cumulative net traffic
+    * Work in improving autoUnit
+    * Take into account the number of core in the CPU process limit
+    * API improvment add time_since_update for disk, process_disk and network
+    * Improve help display
+    * Add more dummy FS to the ignore list
+    * Code refactory: psutil < 0.4.1 is deprecated (Thk to Alessio)
+    * Correct a bug on the CPU process limit
+    * Fix crash bug when specifying custom server port
+    * Add Debian style init script for the Glances server
+
+Version 1.6
+===========
+
+    * Configuration file: user can defines limits
+    * In client/server mode, limits are set by the server side
+    * Display limits in the help screen
+    * Add per process IO (read and write) rate in B per second
+      IO rate only available on Linux from a root account
+    * If CPU iowait alert then sort by processes by IO rate
+    * Per CPU display IOwait (if data is available)
+    * Add password for the client/server mode (-P password)
+    * Process column style auto (underline) or manual (bold)
+    * Display a sort indicator (is space is available)
+    * Change the table key in the help screen
+
+Version 1.5.2
+=============
+
+    * Add sensors module (enable it with -e option)
+    * Improve CPU stats (IO wait, Nice, IRQ)
+    * More stats in lower space (yes it's possible)
+    * Refactor processes list and count (lower CPU/MEM footprint)
+    * Add functions to the RCP method
+    * Completed unit test
+    * and fixes...
+
+Version 1.5.1
+=============
+
+    * Patch for psutil 0.4 compatibility
+    * Test psutil version before running Glances
+
+Version 1.5
+===========
+
+    * Add a client/server mode (XMLRPC) for remote monitoring
+    * Correct a bug on process IO with non root users
+    * Add 'w' shortkey to delete finished warning message
+    * Add 'x' shortkey to delete finished warning/critical message
+    * Bugs correction
+    * Code optimization
+
+Version 1.4.2.2
+===============
+
+    * Add switch between bit/sec and byte/sec for network IO
+    * Add Changelog (generated with gitchangelog)
+
+Version 1.4.2.1
+===============
+
+    * Minor patch to solve memomy issue (#94) on Mac OS X
+
+Version 1.4.2
+=============
+
+    * Use the new virtual_memory() and virtual_swap() fct (psutil)
+    * Display "Top process" in logs
+    * Minor patch on man page for Debian packaging
+    * Code optimization (less try and except)
+
+Version 1.4.1.1
+===============
+
+    * Minor patch to disable Process IO for OS X (not available in psutil)
+
+Version 1.4.1
+=============
+
+    * Per core CPU stats (if space is available)
+    * Add Process IO Read/Write information (if space is available)
+    * Uniformize units
+
+Version 1.4
+===========
+
+    * Goodby StatGrab... Welcome to the psutil library !
+    * No more autotools, use setup.py to install (or package)
+    * Only major stats (CPU, Load and memory) use background colors
+    * Improve operating system name detection
+    * New system info: one-line layout and add Arch Linux support
+    * No decimal places for values < GB
+    * New memory and swap layout
+    * Add percentage of usage for both memory and swap
+    * Add MEM% usage, NICE, STATUS, UID, PID and running TIME per process
+    * Add sort by MEM% ('m' key)
+    * Add sort by Process name ('p' key)
+    * Multiple minor fixes, changes and improvements
+    * Disable Disk IO module from the command line (-d)
+    * Disable Mount module from the command line (-m)
+    * Disable Net rate module from the command line (-n)
+    * Improved FreeBSD support
+    * Cleaning code and style
+    * Code is now checked with pep8
+    * CSV and HTML output (experimental functions, no yet documentation)
+
+Version 1.3.7
+=============
+
+    * Display (if terminal space is available) an alerts history (logs)
+    * Add a limits classe to manage stats limits
+    * Manage black and white console (issue #31)
+
+Version 1.3.6
+=============
+
+    * Add control before libs import
+    * Change static Python path (issue #20)
+    * Correct a bug with a network interface disaippear (issue #27)
+    * Add French and Spanish translation (thx to Jean Bob)
+
+Version 1.3.5
+=============
+
+    * Add an help panel when Glances is running (key: 'h')
+    * Add keys descriptions in the syntax (--help | -h)
+
+Version 1.3.4
+=============
+
+    * New key: 'n' to enable/disable network stats
+    * New key: 'd' to enable/disable disk IO stats
+    * New key: 'f' to enable/disable FS stats
+    * Reorganised the screen when stat are not available|disable
+    * Force Glances to use the enmbeded fs stats (issue #16)
+
+Version 1.3.3
+=============
+
+    * Automatically swith between process short and long name
+    * Center the host / system information
+    * Always put the hour/date in the bottom/right
+    * Correct a bug if there is a lot of Disk/IO
+    * Add control about available libstatgrab functions
+
+Version 1.3.2
+=============
+
+    * Add alert for network bit rate°
+    * Change the caption
+    * Optimised net, disk IO and fs display (share the space)
+      Disable on Ubuntu because the libstatgrab return a zero value
+      for the network interface speed.
+
+Version 1.3.1
+=============
+
+    * Add alert on load (depend on number of CPU core)
+    * Fix bug when the FS list is very long
+
+Version 1.3
+===========
+
+    * Add file system stats (total and used space)
+    * Adapt unit dynamically (K, M, G)
+    * Add man page (Thanks to Edouard Bourguignon)
+
+Version 1.2
+===========
+
+    * Resize the terminal and the windows are adapted dynamically
+    * Refresh screen instantanetly when a key is pressed
+
+Version 1.1.3
+=============
+
+    * Add disk IO monitoring
+    * Add caption
+    * Correct a bug when computing the bitrate with the option -t
+    * Catch CTRL-C before init the screen (Bug #2)
+    * Check if mem.total = 0 before division (Bug #1)
diff --git a/abs/extra/glances/PKGBUILD b/abs/extra/glances/PKGBUILD
index e2e29e1..0ab3a3e 100644
--- a/abs/extra/glances/PKGBUILD
+++ b/abs/extra/glances/PKGBUILD
@@ -1,16 +1,17 @@
-# Maintainer: Sébastien Luttringer <seblu@archlinux.org>
+# Maintainer: Christian Rebischke <chris.rebischke@archlinux.org>
+# Contributor: Sébastien Luttringer <seblu@archlinux.org>
 # Contributor: Bartłomiej Piotrowski <bpiotrowski@archlinux.org>
 # Contributor: Francois Boulogne <fboulogne at april dot org>
 
 pkgname=glances
-pkgver=3.1.0
+pkgver=3.1.4.1
 pkgrel=1
 pkgdesc='CLI curses-based monitoring tool'
 arch=('any')
 url='https://github.com/nicolargo/glances'
 license=('LGPL')
 makedepends=('git')
-depends=('python' 'python-psutil' 'python-setuptools')
+depends=('python' 'python-psutil' 'python-setuptools' 'python-future')
 optdepends=('hddtemp: HDD temperature monitoring support'
             'python-bottle: web server support'
             'python-docker: for the Docker monitoring support'
@@ -19,8 +20,9 @@ optdepends=('hddtemp: HDD temperature monitoring support'
             'python-zeroconf: for the autodiscover mode')
 source=("https://github.com/nicolargo/glances/archive/v${pkgver}.tar.gz"
         'glances.service')
-sha512sums=('a888cafa5987ab7a88caa0248e0cb3d9f65466d71ee8f1ca63565c5a8a59282be77c14f29afb2302fba0e79294c39e96384791cd89d23aa7727bfd4f20e2814d'
+sha512sums=('8e15149bde87d14d8176fe247e911a04b24900a95917e5711dfc8764ecec3238f696eea08c36bc59f68a4702e028909150e3318907f11fc53c5cc56441870ff3'
             '49f0d185a37a5c5837e5beb463770c943ede40b2f1b8405e338129e897e97d9fc58373a8586fabc506266e6343cfea3c91b9787ac6832cc97a1ab63d6ad058d4')
+changelog=NEWS.rst
 
 package() {
   cd "glances-${pkgver}"
-- 
cgit v0.12

