From b5b8260ba5f186be49617572bca04ee48e1cdcb2 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Sun, 26 Aug 2012 15:46:16 -0500
Subject: LinHES-config:  When using non-splash keep console in non-gfx mode  
 09 mythvantage_runit_grub:

---
 abs/core/LinHES-config/09_mythvantge_runit_grub | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

diff --git a/abs/core/LinHES-config/09_mythvantge_runit_grub b/abs/core/LinHES-config/09_mythvantge_runit_grub
index cfebc56..1d7774e 100644
--- a/abs/core/LinHES-config/09_mythvantge_runit_grub
+++ b/abs/core/LinHES-config/09_mythvantge_runit_grub
@@ -27,8 +27,8 @@ menuentry 'LinHES' --class arch --class gnu-linux --class gnu --class os $menuen
     initrd  /boot/initramfs-linux.img
     }
 menuentry 'LinHES --no-splash' --class arch --class gnu-linux --class gnu --class os $menuentry_id_option 'gnulinux-core repo kernel-true-$boot_device_id' {
-    load_video
-    set gfxpayload=keep
+    #load_video
+    #set gfxpayload=keep
     insmod gzio
     insmod part_msdos
     insmod ext2
-- 
cgit v0.12

