From cad3e735f2af8eb22f7b9e37e977558ca39c409d Mon Sep 17 00:00:00 2001
From: Britney Fransen <brfransen@gmail.com>
Date: Wed, 1 Jul 2020 19:37:17 +0000
Subject: LinHES-system: system.install: don't run mythwelcome-config.py on
 install

---
 abs/core/LinHES-system/PKGBUILD       | 2 +-
 abs/core/LinHES-system/system.install | 3 ---
 2 files changed, 1 insertion(+), 4 deletions(-)

diff --git a/abs/core/LinHES-system/PKGBUILD b/abs/core/LinHES-system/PKGBUILD
index f95e899..2b769d3 100755
--- a/abs/core/LinHES-system/PKGBUILD
+++ b/abs/core/LinHES-system/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=LinHES-system
 pkgver=8.7.0
-pkgrel=1
+pkgrel=2
 arch=('x86_64')
 install=system.install
 pkgdesc="Everything that makes LinHES an automated system"
diff --git a/abs/core/LinHES-system/system.install b/abs/core/LinHES-system/system.install
index 558a52a..e0fe68b 100644
--- a/abs/core/LinHES-system/system.install
+++ b/abs/core/LinHES-system/system.install
@@ -13,9 +13,6 @@ post_install() {
         rm -f /etc/cron.daily/myth_mtc
     fi
 
-    #run mythwelcome-config.py to update shutdown check to use idle.py
-    /usr/LH/bin/mythwelcome-config.py
-
     sv restart msg_daemon
 }
 
-- 
cgit v0.12

