From 51df4a02b962588f922e95328d89e2b67eebdab6 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Wed, 22 Oct 2014 17:06:37 -0500
Subject: mythinstall:  fix serial transmitter selection screen. The serial
 blaster was an empty screen when it should have shown the blaster set to use.
   Simply  a case of  Serial  vs serial

---
 abs/core/mythinstall/MythVantage-app/mythinstall/infrared.cpp | 4 ++--
 abs/core/mythinstall/PKGBUILD                                 | 2 +-
 2 files changed, 3 insertions(+), 3 deletions(-)

diff --git a/abs/core/mythinstall/MythVantage-app/mythinstall/infrared.cpp b/abs/core/mythinstall/MythVantage-app/mythinstall/infrared.cpp
index 34a2a33..cd56683 100755
--- a/abs/core/mythinstall/MythVantage-app/mythinstall/infrared.cpp
+++ b/abs/core/mythinstall/MythVantage-app/mythinstall/infrared.cpp
@@ -528,7 +528,7 @@ static HostComboBox *HostBlasterType()
     //gc->addSelection("pvr150");
     gc->addSelection("iguanaIR-usb");
     gc->addSelection("hd_pvr");
-    gc->setHelpText(QObject::tr("The type of infrared transmitter being used.  Selecting CommandIR or iguanaIR-usb will use that device for both transmitting and receiving.  All other receivers will be disabled."));
+    gc->setHelpText(QObject::tr("The type of infrared transmitter being used. Receiver will use the receiver settings. Selecting CommandIR or iguanaIR-usb will use that device for both transmitting and receiving.  All other receivers will be disabled."));
     gc->setValue("None");
     return gc;
 };
@@ -673,7 +673,7 @@ public:
 
         addTarget("None", blanksettings);
         addTarget("Receiver", transmit_1);
-        addTarget("Serial", serial_settings);
+        addTarget("serial", serial_settings);
         addTarget("CommandIR", CommandIRsettings);
         //addTarget("pvr150",blanksettings);
         addTarget("hd_pvr",transmit_1);
diff --git a/abs/core/mythinstall/PKGBUILD b/abs/core/mythinstall/PKGBUILD
index 45fbd26..c37757d 100644
--- a/abs/core/mythinstall/PKGBUILD
+++ b/abs/core/mythinstall/PKGBUILD
@@ -1,7 +1,7 @@
 # Maintainer: Jams
 pkgname=mythinstall
 pkgver=8.2
-pkgrel=6
+pkgrel=7
 pkgdesc="LinHES installer/systemconfig GUI."
 arch=('i686' 'x86_64')
 depends=('mythtv>=0.27')
-- 
cgit v0.12

