From 912e7ca6626505c47c3c582efb74ff26bc418a37 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Fri, 27 Dec 2013 10:58:21 -0600
Subject: runit-scrips , mv_ir:  remove loading of lirc_serial by
 modules.mythvantage, the run script takes care of loading with the correct
 values.

Add more debugging to remotes log

refs #950
---
 abs/core/LinHES-config/PKGBUILD                    |  4 ++--
 abs/core/LinHES-config/mv_ir.py                    |  5 +++--
 abs/core/runit-scripts/PKGBUILD                    |  2 +-
 .../runitscripts/services/remotes/run              | 25 ++++++++++++++++------
 4 files changed, 24 insertions(+), 12 deletions(-)

diff --git a/abs/core/LinHES-config/PKGBUILD b/abs/core/LinHES-config/PKGBUILD
index 75b93a2..5ca210b 100755
--- a/abs/core/LinHES-config/PKGBUILD
+++ b/abs/core/LinHES-config/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=LinHES-config
 pkgver=8.1
-pkgrel=8
+pkgrel=9
 conflicts=(MythVantage-config MythVantage-config-dev LinHES-config-dev LinHes-config )
 pkgdesc="Install and configure your system"
 depends=('bc' 'libstatgrab' 'mysql-python' 'expect' 'curl' 'dnsutils' 'parted'
@@ -159,7 +159,7 @@ md5sums=('8ee14247b04ab4152d4919d4d4b8d869'
          'c0549457750c4f8e8038d904a0f3012a'
          '075fe16ef92621ce31f41df5c5577daf'
          'b845de3e05c1734cce4b9ac5e8f1baaf'
-         '31ad5416bf2ab1909338a16035941127'
+         '6356c271bf6639002d4c59406250a1f6'
          '8b7dce4a3a0a281fa6656aa8781a648e'
          'f7f2dc11d1ba454cd25eeaa133104b62'
          '824e49d9b01fed295c704ab68908b464'
diff --git a/abs/core/LinHES-config/mv_ir.py b/abs/core/LinHES-config/mv_ir.py
index f481fa4..1eae985 100755
--- a/abs/core/LinHES-config/mv_ir.py
+++ b/abs/core/LinHES-config/mv_ir.py
@@ -202,7 +202,8 @@ def setup_ir_receiver(ReceiverType,TEMPLATES,HDHRlirc_device,myip):
     logging.info("    Configuring receiver %s", ReceiverType)
     if ReceiverType == "serial":
         scrub_modules("/etc/modules.mythvantage","lirc")
-        add_module("/etc/modules.mythvantage","lirc_serial    #lirc")
+        #loading takes place in remotes/run
+        #add_module("/etc/modules.mythvantage","lirc_serial    #lirc")
         cmd = "load-modules-mythvantage.sh"
         mv_common.runcmd(cmd)
         mv_common.remove_service("igdaemon")
@@ -301,7 +302,7 @@ def setup_blaster_transmiter(HostBlasterType):
         mv_common.add_service("igdaemon")
     elif HostBlasterType == "serial":
         scrub_modules("/etc/modules.mythvantage","blaster")
-        add_module("/etc/modules/.mythvantage","lirc_serial    #blaster")
+        #add_module("/etc/modules/.mythvantage","lirc_serial    #blaster")
         cmd = "load-modules-mythvantage.sh"
         mv_common.runcmd(cmd)
     elif HostBlasterType == "pvr150":
diff --git a/abs/core/runit-scripts/PKGBUILD b/abs/core/runit-scripts/PKGBUILD
index 9857b4a..b1240ab 100755
--- a/abs/core/runit-scripts/PKGBUILD
+++ b/abs/core/runit-scripts/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=runit-scripts
 pkgver=8.1
-pkgrel=5
+pkgrel=6
 pkgdesc="collection of startup scripts for runit"
 url="http://smarden.org/runit/"
 license="BSD"
diff --git a/abs/core/runit-scripts/runitscripts/services/remotes/run b/abs/core/runit-scripts/runitscripts/services/remotes/run
index 4040d7e..2363a3a 100755
--- a/abs/core/runit-scripts/runitscripts/services/remotes/run
+++ b/abs/core/runit-scripts/runitscripts/services/remotes/run
@@ -14,6 +14,10 @@ fi
 
 echo "`date` --- run started" >> $LOG
 
+echo "====== lirc modules already loaded ==========" >> $LOG
+lsmod |grep lirc >> $LOG
+echo "====== lirc modules end =========" >> $LOG
+echo >> $LOG
 #What is done in this file may not be enough to start your specific remote.
 #If that is true of your remote place your remote startup commands in:
 # /etc/runit/lirc.sh
@@ -47,29 +51,36 @@ else
 
     if [ -n "$serial_port" ]
     then
+        echo "Serial device setup:  $serial_port" >>$LOG
         #/dev/ttyS0 (COM1), port 0x3f8, irq 4
         #/dev/ttyS1 (COM2), port 0x2f8, irq 3
         #/dev/ttyS2 (COM3), port 0x3e8, irq 4
         #/dev/ttyS3 (COM4), port 0x2e8, irq 3
-
+        printhl "   Using serial device, loading module lirc_serial"
         case $serial_port in
         ttyS0)
-               FLAGS="io=0x3f8  irq=4"
+               FLAGS="io=0x3f8  irq=4 debug=1 "
                ;;
         ttyS1)
-               FLAGS="io=0x2f8  irq=3"
+               FLAGS="io=0x2f8  irq=3 debug=1"
                ;;
         ttyS2)
-               FLAGS="io=0x3e8  irq=4"
+                FLAGS="io=0x3e8  irq=4 debug=1"
                ;;
         ttyS3)
-               FLAGS="io=0x2e8  irq=3"
+                FLAGS="io=0x2e8  irq=3 debug=1"
                ;;
         esac
-        /usr/bin/setserial /dev/$serial_port uart none
+        
+        /usr/bin/setserial /dev/$serial_port uart none 2>&1 >> $LOG
         sleep 0.5
-        /sbin/modprobe lirc_serial $FLAGS
+        echo "/sbin/modprobe lirc_serial $FLAGS" 2>&1 >> $LOG
+        /sbin/modprobe lirc_serial $FLAGS 2>&1 >> $LOG
         sleep 0.5
+        echo "====== dmesg output ============" >>$LOG
+        dmesg | tail -10 >> $LOG
+        echo "======= dmesg end ===========" >>$LOG
+        
     fi
 
     if [ x$HostBlasterType = xCommandIR -o x$ReceiverType = xCommandIR ]
-- 
cgit v0.12

