From a08b2f33727ae551dc79610cabb7ddeecd5da4b7 Mon Sep 17 00:00:00 2001
From: Britney Fransen <brfransen@gmail.com>
Date: Tue, 2 Jul 2013 12:24:55 -0500
Subject: dvb-firmware: enable xc5000 no_poweroff. close #918

---
 abs/core/dvb-firmware/PKGBUILD    | 4 ++--
 abs/core/dvb-firmware/xc5000.conf | 2 +-
 2 files changed, 3 insertions(+), 3 deletions(-)

diff --git a/abs/core/dvb-firmware/PKGBUILD b/abs/core/dvb-firmware/PKGBUILD
index 512422f..b03deac 100644
--- a/abs/core/dvb-firmware/PKGBUILD
+++ b/abs/core/dvb-firmware/PKGBUILD
@@ -3,7 +3,7 @@
 
 pkgname=dvb-firmware
 pkgver=1
-pkgrel=18
+pkgrel=19
 pkgdesc="Firmware for DVB cards"
 replaces=('hd3000firmware')
 arch=('i586' 'i686' 'x86_64')
@@ -18,4 +18,4 @@ build() {
   install -D -m644 "${srcdir}/xc5000.conf" "${pkgdir}/etc/modprobe.d/"
 }
 md5sums=('d2ba68a1e49adbb71431295fc96cda60'
-         '08c7619f37757f0d6191866701212575')
+         '08529c85be55836394d1047b85b869a3')
diff --git a/abs/core/dvb-firmware/xc5000.conf b/abs/core/dvb-firmware/xc5000.conf
index 93b3ab4..4124136 100644
--- a/abs/core/dvb-firmware/xc5000.conf
+++ b/abs/core/dvb-firmware/xc5000.conf
@@ -3,4 +3,4 @@
 #
 #   When v4l-dvb is installed no_poweroff=1 is no longer needed.
 #
-#options xc5000 no_poweroff=1
+options xc5000 no_poweroff=1
-- 
cgit v0.12

