From a091721d6178ffaa83ee445a5908419a39fdaba0 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Fri, 7 Dec 2012 09:06:32 -0600
Subject: dbus-core:  removed __changelog, the locking placeholder is no longer
 needed

---
 abs/core/dbus-core/__changelog | 0
 1 file changed, 0 insertions(+), 0 deletions(-)
 delete mode 100644 abs/core/dbus-core/__changelog

diff --git a/abs/core/dbus-core/__changelog b/abs/core/dbus-core/__changelog
deleted file mode 100644
index e69de29..0000000
-- 
cgit v0.12

