From dacae1d9673958dbeceae2ec93758cc3d4b9995e Mon Sep 17 00:00:00 2001
From: Britney Fransen <brfransen@gmail.com>
Date: Wed, 4 Dec 2013 14:25:28 -0600
Subject: apcupsd: readd for R8. closes#949.

runit-scripts: add apcupsd
---
 abs/core/runit-scripts/PKGBUILD                    |  7 ++--
 abs/core/runit-scripts/fbsplash-runit.sh           | 37 -----------------
 .../runitscripts/services/apcupsd/run              |  8 ++++
 abs/extra/apcupsd/PKGBUILD                         | 47 ++++++++++++++++++++++
 abs/extra/apcupsd/__changelog                      |  3 ++
 abs/extra/apcupsd/apcupsd-tmpfiles.conf            |  2 +
 abs/extra/apcupsd/apcupsd.install                  | 24 +++++++++++
 abs/extra/apcupsd/apcupsd.service                  |  8 ++++
 8 files changed, 95 insertions(+), 41 deletions(-)
 delete mode 100755 abs/core/runit-scripts/fbsplash-runit.sh
 create mode 100755 abs/core/runit-scripts/runitscripts/services/apcupsd/run
 create mode 100644 abs/extra/apcupsd/PKGBUILD
 create mode 100644 abs/extra/apcupsd/__changelog
 create mode 100644 abs/extra/apcupsd/apcupsd-tmpfiles.conf
 create mode 100644 abs/extra/apcupsd/apcupsd.install
 create mode 100644 abs/extra/apcupsd/apcupsd.service

diff --git a/abs/core/runit-scripts/PKGBUILD b/abs/core/runit-scripts/PKGBUILD
index 2e5d50b..745edb3 100755
--- a/abs/core/runit-scripts/PKGBUILD
+++ b/abs/core/runit-scripts/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=runit-scripts
 pkgver=8.1
-pkgrel=1
+pkgrel=2
 pkgdesc="collection of startup scripts for runit"
 url="http://smarden.org/runit/"
 license="BSD"
@@ -10,7 +10,7 @@ conflicts=()
 replaces=()
 backup=('etc/runit/1.local' 'etc/runit/3.local')
 install=runit.install
-source=(fbsplash-runit.sh)
+source=()
 arch=('i686' 'x86_64')
 
 build() {
@@ -26,10 +26,9 @@ package() {
   install -d $pkgdir/etc/rc.d/functions.d
 
   install -m0700 1 2 3 1.local 3.local ctrlaltdel $pkgdir/etc/runit
-  install -m755 $srcdir/fbsplash-runit.sh $pkgdir/etc/rc.d/functions.d/fbsplash-runit.sh
   install -m0755 reboot-runit halt-runit logger $pkgdir/sbin
   rsync -a --exclude=.svn services/* $pkgdir/etc/sv
   chmod -R  755 $pkgdir/etc/sv
   chown -R root:root $pkgdir/etc/sv
 }
-md5sums=('c79246677d5ffe687bcf6df1b9c2abc2')
+md5sums=()
diff --git a/abs/core/runit-scripts/fbsplash-runit.sh b/abs/core/runit-scripts/fbsplash-runit.sh
deleted file mode 100755
index 87435ee..0000000
--- a/abs/core/runit-scripts/fbsplash-runit.sh
+++ /dev/null
@@ -1,37 +0,0 @@
-# fbsplash functions.d runit script #
-
-printhlr() {
-               printf "${C_OTHER}${PREFIX_REG} ${C_H1}${1}${C_CLEAR} \n"
-           }
-
-stat_runit(){
-	printf ""
-	printhlr "${C_MAIN}${1}${C_CLEAR} "
-}
-
-
-# splash stuff #
-if [ -e /etc/conf.d/fbcondecor ]
-then
-	. /etc/conf.d/fbcondecor
-	. /sbin/splash-functions.sh
-
-	case $0 in /etc/runit/1 )
-		# Prevent splash destruction
-		CONSOLEFONT=""
-		# Continue to use a splash daemon started in initcpio
-		if /bin/mountpoint -q /run/.splash-cache; then
-			/bin/mount --move /run/.splash-cache $spl_cachedir || return
-		# Mount a tmpfs
-		else
-			( splash_cache_prep ) || return
-		fi
-
-		splash_comm_send set message "$SPLASH_BOOT_MESSAGE"
-
-	;; /etc/runit/3 )
-		( splash_cache_prep ) || return
-
-		splash_comm_send set message "$SPLASH_SHUTDOWN_MESSAGE"
-	esac
-fi
diff --git a/abs/core/runit-scripts/runitscripts/services/apcupsd/run b/abs/core/runit-scripts/runitscripts/services/apcupsd/run
new file mode 100755
index 0000000..70bd9e0
--- /dev/null
+++ b/abs/core/runit-scripts/runitscripts/services/apcupsd/run
@@ -0,0 +1,8 @@
+#!/bin/sh
+exec 2>&1
+
+. /etc/rc.conf
+. /etc/rc.d/functions
+
+stat_runit "Starting APC UPS Daemon"
+exec /usr/bin/apcupsd -b -f /etc/apcupsd/apcupsd.conf
diff --git a/abs/extra/apcupsd/PKGBUILD b/abs/extra/apcupsd/PKGBUILD
new file mode 100644
index 0000000..31a3cfa
--- /dev/null
+++ b/abs/extra/apcupsd/PKGBUILD
@@ -0,0 +1,47 @@
+# $Id$
+# Maintainer: Sergej Pupykin <pupykin.s+arch@gmail.com>
+# Maintainer: Todd Musall <tmusall@comcast.net>
+# Maintainer: Massimiliano Torromeo <massimiliano.torromeo@gmail.com>
+
+pkgname=apcupsd
+pkgver=3.14.10
+pkgrel=7
+pkgdesc="Power mangement and controlling most of APC's UPS models"
+arch=(i686 x86_64)
+url="http://www.apcupsd.org"
+license=('GPL')
+install=apcupsd.install
+depends=('gcc-libs')
+optdepends=('gd: for CGI'
+            'gconf: for frontend'
+            'gtk2: for frontend')
+makedepends=('pkgconfig' 'gd' 'gconf' 'gtk2')
+backup=(etc/apcupsd/apcupsd.conf etc/apcupsd/hosts.conf
+        etc/apcupsd/multimon.conf)
+source=(http://downloads.sourceforge.net/apcupsd/$pkgname-$pkgver.tar.gz
+        apcupsd.service
+        apcupsd-tmpfiles.conf)
+sha256sums=('0707b5ec9916fbde9e44eb8d18037c8d8f75dfd6aeef51aba5487e189eef2032'
+            '145e88863335f077fc354b4d263b15f64af67b45a10ed37c68ebd468181e23f7'
+            'b00cd1a31de70a172698d486583aa79113b99c1bb4b882ab906d0e37504d7f55')
+
+build() {
+	cd "$srcdir/$pkgname-$pkgver"
+	./configure --prefix=/usr  --libexecdir=/usr/lib/$pkgname \
+		--sbindir=/usr/bin \
+		--enable-cgi --enable-usb --enable-net \
+		--with-upstype=usb --with-upscable=usb \
+		--with-serial-dev=/dev/usb/hid/hiddev[0-9] \
+		--enable-pthreads --enable-gapcmon
+	make
+}
+
+package() {
+	cd "$srcdir/$pkgname-$pkgver"
+	make DESTDIR="$pkgdir" install
+	install -Dm644 "$srcdir/apcupsd.service" "$pkgdir/usr/lib/systemd/system/apcupsd.service"
+	install -Dm644 "$srcdir/apcupsd-tmpfiles.conf" "$pkgdir/usr/lib/tmpfiles.d/apcupsd.conf"
+	chmod 755 "$pkgdir"/usr/bin/*
+	install -dm755 "$pkgdir/usr/lib/$pkgname/cgi-bin"
+	mv "$pkgdir"/etc/apcupsd/*.cgi "$pkgdir/usr/lib/$pkgname/cgi-bin"
+}
diff --git a/abs/extra/apcupsd/__changelog b/abs/extra/apcupsd/__changelog
new file mode 100644
index 0000000..3c43f29
--- /dev/null
+++ b/abs/extra/apcupsd/__changelog
@@ -0,0 +1,3 @@
+remove systemd-sysvcompat as dep
+add apcupsd.install to have runit start the service
+
diff --git a/abs/extra/apcupsd/apcupsd-tmpfiles.conf b/abs/extra/apcupsd/apcupsd-tmpfiles.conf
new file mode 100644
index 0000000..0ceb410
--- /dev/null
+++ b/abs/extra/apcupsd/apcupsd-tmpfiles.conf
@@ -0,0 +1,2 @@
+r /etc/apcupsd/powerfail
+r /etc/nologin
\ No newline at end of file
diff --git a/abs/extra/apcupsd/apcupsd.install b/abs/extra/apcupsd/apcupsd.install
new file mode 100644
index 0000000..3f1e6b2
--- /dev/null
+++ b/abs/extra/apcupsd/apcupsd.install
@@ -0,0 +1,24 @@
+# This is a default template for a post-install scriptlet.  You can
+# remove any functions you don't need (and this header).
+
+# arg 1:  the new package version
+post_install() {
+    add_service.sh apcupsd
+    /sbin/sv start apcupsd
+}
+
+# arg 1:  the new package version
+# arg 2:  the old package version
+post_upgrade() {
+    post_install
+}
+
+# arg 1:  the old package version
+post_remove() {
+    /sbin/sv stop apcupsd
+    remove_service.sh apcupsd
+}
+
+op=$1
+shift
+$op $*
diff --git a/abs/extra/apcupsd/apcupsd.service b/abs/extra/apcupsd/apcupsd.service
new file mode 100644
index 0000000..b8dfb9b
--- /dev/null
+++ b/abs/extra/apcupsd/apcupsd.service
@@ -0,0 +1,8 @@
+[Unit]
+Description=APC UPS Monitor
+
+[Service]
+ExecStart=/usr/bin/apcupsd -b
+
+[Install]
+WantedBy=multi-user.target
-- 
cgit v0.12

