From dbffaa2d8cb83d299a5b3c456e9f39a03c76cac0 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Tue, 7 Aug 2012 13:08:10 -0500
Subject: poweroff-scripts: added x86_64

---
 abs/core/poweroff-scripts/PKGBUILD | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/abs/core/poweroff-scripts/PKGBUILD b/abs/core/poweroff-scripts/PKGBUILD
index af2fcd4..f15cddf 100644
--- a/abs/core/poweroff-scripts/PKGBUILD
+++ b/abs/core/poweroff-scripts/PKGBUILD
@@ -10,7 +10,7 @@ replaces=()
 backup=()
 install=poweroff-scripts.install
 source=(halt.script reboot.script poweroff.script shutdown.script)
-arch=('i686')
+arch=('i686' 'x86_64')
 
 build() {
   install -d $pkgdir/sbin/
-- 
cgit v0.12

