From 031d96551bb50e4cf0b0f5eeaa30aa759b9ceeb4 Mon Sep 17 00:00:00 2001
From: Michael Hanson <hansonorders@verison.net>
Date: Fri, 12 Mar 2010 18:58:44 +0000
Subject: hauppauge-hvr-firmware: fix a link that should not be there

---
 abs/core-testing/hauppauge-hvr-firmware/PKGBUILD | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

diff --git a/abs/core-testing/hauppauge-hvr-firmware/PKGBUILD b/abs/core-testing/hauppauge-hvr-firmware/PKGBUILD
index 6011436..f9a488d 100755
--- a/abs/core-testing/hauppauge-hvr-firmware/PKGBUILD
+++ b/abs/core-testing/hauppauge-hvr-firmware/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=hauppauge-hvr-firmware
 pkgver=1
-pkgrel=2
+pkgrel=3
 pkgdesc="firmware needed for the hvr cards"
 arch=(i686 x86_64)
 url=""
@@ -20,5 +20,5 @@ build() {
   mv hcw85mlC.rom v4l-cx23885-avcore-01.fw
   cp -rp *.fw  $startdir/pkg/lib/firmware
   cd $startdir/src/
-  cp -rp *.fw  $startdir/pkg/lib/firmware
+  cp *.fw  $startdir/pkg/lib/firmware
 }
-- 
cgit v0.12

