From 1355a3b9649a15b3a35d1ef6d034f51e3802fe14 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Sun, 14 Jun 2009 21:19:00 -0500
Subject: system-templates: add phantom buttons to dvico Closes FS#386

---
 abs/core-testing/system-templates/PKGBUILD                           | 2 +-
 .../system-templates/templates/remotes/dvico/lircd.conf.fusionHDTV   | 5 +++++
 2 files changed, 6 insertions(+), 1 deletion(-)

diff --git a/abs/core-testing/system-templates/PKGBUILD b/abs/core-testing/system-templates/PKGBUILD
index 5a195c5..741121b 100755
--- a/abs/core-testing/system-templates/PKGBUILD
+++ b/abs/core-testing/system-templates/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=system-templates
 pkgver=1.0
-pkgrel=20
+pkgrel=21
 conflicts=( )
 pkgdesc="Templates used for system configuration"
 depends=()
diff --git a/abs/core-testing/system-templates/templates/remotes/dvico/lircd.conf.fusionHDTV b/abs/core-testing/system-templates/templates/remotes/dvico/lircd.conf.fusionHDTV
index fbc91a8..7f03ba1 100644
--- a/abs/core-testing/system-templates/templates/remotes/dvico/lircd.conf.fusionHDTV
+++ b/abs/core-testing/system-templates/templates/remotes/dvico/lircd.conf.fusionHDTV
@@ -214,6 +214,11 @@ begin remote
           stop                     0x0D
           rec                      0x01
           power_onoff              0x4e
+          phantom1                 0x7b
+          phantom2                 0x6b
+          phantom3                 0x77
+          phantom4                 0x4b
+          phantom5                 0x3b
       end codes
 
 end remote
-- 
cgit v0.12

