From 6cd593470c94ffb4196fc1b5b29529035320bb2b Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Fri, 13 Nov 2009 00:40:19 -0600
Subject: runit-scripts: lirc  fix type so that serial_port is used as a var
 instead of string.

---
 abs/core-testing/runit-scripts/PKGBUILD                        | 2 +-
 abs/core-testing/runit-scripts/runitscripts/services/lircd/run | 2 +-
 2 files changed, 2 insertions(+), 2 deletions(-)

diff --git a/abs/core-testing/runit-scripts/PKGBUILD b/abs/core-testing/runit-scripts/PKGBUILD
index 3407502..60d78b5 100755
--- a/abs/core-testing/runit-scripts/PKGBUILD
+++ b/abs/core-testing/runit-scripts/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=runit-scripts
 pkgver=1.8.0
-pkgrel=97
+pkgrel=101
 pkgdesc="collection of startup scripts for runit"
 url="http://smarden.org/runit/"
 license="BSD"
diff --git a/abs/core-testing/runit-scripts/runitscripts/services/lircd/run b/abs/core-testing/runit-scripts/runitscripts/services/lircd/run
index 9498f02..07ec214 100755
--- a/abs/core-testing/runit-scripts/runitscripts/services/lircd/run
+++ b/abs/core-testing/runit-scripts/runitscripts/services/lircd/run
@@ -72,7 +72,7 @@ else
                FLAGS="io=0x2e8  irq=3"
                ;;
         esac
-        /usr/bin/setserial /dev/serial_port uart none
+        /usr/bin/setserial /dev/$serial_port uart none
 	sleep 0.5
         /sbin/modprobe lirc_serial $FLAGS
 	sleep 0.5
-- 
cgit v0.12

