From 7e602bbe327e10ffda089d4f47dfe9412c184b7a Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Sun, 4 Oct 2009 15:50:27 -0500
Subject: pil: link against libjpeg6

---
 abs/core-testing/pil/PKGBUILD    | 2 +-
 abs/core-testing/pil/__changelog | 2 ++
 2 files changed, 3 insertions(+), 1 deletion(-)
 create mode 100644 abs/core-testing/pil/__changelog

diff --git a/abs/core-testing/pil/PKGBUILD b/abs/core-testing/pil/PKGBUILD
index 29c0b60..f16214a 100644
--- a/abs/core-testing/pil/PKGBUILD
+++ b/abs/core-testing/pil/PKGBUILD
@@ -4,7 +4,7 @@
 
 pkgname=pil
 pkgver=1.1.6
-pkgrel=8
+pkgrel=9
 pkgdesc="Python imaging library"
 arch=('i686' 'x86_64')
 url="http://www.pythonware.com/products/pil/index.htm"
diff --git a/abs/core-testing/pil/__changelog b/abs/core-testing/pil/__changelog
new file mode 100644
index 0000000..91214ed
--- /dev/null
+++ b/abs/core-testing/pil/__changelog
@@ -0,0 +1,2 @@
+__change so that it builds against libjpeg6 and not libjpeg7
+  sed -i "s#JPEG_ROOT\ =\ None#JPEG_ROOT\ =\ \"/opt/libjpeg6\"#" setup.py
-- 
cgit v0.12

