From 970414c635cc636bcbd9b93904bf701336ea7055 Mon Sep 17 00:00:00 2001
From: Michael Hanson <hansonorders@verison.net>
Date: Tue, 15 Jun 2010 21:47:16 +0000
Subject: vdpauinfo-legacy: comment out depends line in PKGBUILD instead of
 ('')

---
 abs/core-testing/vdpauinfo-legacy/PKGBUILD | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

diff --git a/abs/core-testing/vdpauinfo-legacy/PKGBUILD b/abs/core-testing/vdpauinfo-legacy/PKGBUILD
index 7e7fe26..d58c672 100644
--- a/abs/core-testing/vdpauinfo-legacy/PKGBUILD
+++ b/abs/core-testing/vdpauinfo-legacy/PKGBUILD
@@ -4,11 +4,11 @@
 
 pkgname=vdpauinfo-legacy
 pkgver=1
-pkgrel=4
+pkgrel=5
 pkgdesc="tells the user they can't handle vdpau"
 license=('GPLv2')
 arch=('i686' 'x86_64')
-depends=('')
+#depends=('')
 # Just let the dependency on the right nvidia and nvidia-utils versions
 # handle conflicts via those packages conflicts.
 conflicts=(vdpauinfo)
-- 
cgit v0.12

