From fb13d828b914fa3e40b9b7242177342b0ea904a7 Mon Sep 17 00:00:00 2001
From: Nathan Harris <nharris@eoimaging.com>
Date: Fri, 17 Jul 2009 16:43:18 -0400
Subject: libtiff: missed the ChangeLog file

---
 abs/core-testing/libtiff/ChangeLog | 8 ++++++++
 1 file changed, 8 insertions(+)
 create mode 100644 abs/core-testing/libtiff/ChangeLog

diff --git a/abs/core-testing/libtiff/ChangeLog b/abs/core-testing/libtiff/ChangeLog
new file mode 100644
index 0000000..1a1c85b
--- /dev/null
+++ b/abs/core-testing/libtiff/ChangeLog
@@ -0,0 +1,8 @@
+2008-09-05  Eric Belanger  <eric@archlinux.org>
+
+	* libtiff 3.8.2-4
+	* Applied patch to fix buffer underflow in LZW decoding	(tiff-3.8.2-CVE-2008-2327.patch)
+	* Added license
+	* Added freeglut optdepends
+	* FHS man pages
+	* Added ChangeLog
-- 
cgit v0.12

