From 518f401ed1ae621beac798067808cc99565b3c5c Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Sun, 7 Jun 2009 22:13:21 -0500
Subject: blah

---
 abs/core-testing/LinHES-config/mv_common.py | 8 +++++---
 1 file changed, 5 insertions(+), 3 deletions(-)

diff --git a/abs/core-testing/LinHES-config/mv_common.py b/abs/core-testing/LinHES-config/mv_common.py
index 9b33454..abf52c3 100755
--- a/abs/core-testing/LinHES-config/mv_common.py
+++ b/abs/core-testing/LinHES-config/mv_common.py
@@ -139,9 +139,11 @@ def restartLCD(RESTART_LCD):
 
 def reloadfe(dbhost,RESTART_LCD):
     logging.debug("____Start of reloadfe____")
-    logging.info("    Clearing Backend cache")
-    cmd = '''/usr/bin/backend_control.sh  clearcache  behost %s''' %dbhost
-    runcmd(cmd)
+    if data_config.SYSTEMTYPE == "MythVantage":
+        logging.info("    Clearing Backend cache")
+        cmd = '''/usr/bin/backend_control.sh  clearcache  behost %s''' %dbhost
+        runcmd(cmd)
+
     restartLCD(RESTART_LCD)
     for pid in getpid("mythfrontend"):
         cmd = ''' kill -s USR1 %s ''' %pid
-- 
cgit v0.12

