From 75aed93d0d9f4394496ef8a742bfdc9e5e66f815 Mon Sep 17 00:00:00 2001
From: Greg Frost <gregfrost1@bigpond.com>
Date: Sat, 16 Jan 2010 07:33:30 +1030
Subject: lirc-utils: fix logrotation

---
 abs/core-testing/lirc-utils/PKGBUILD       | 2 +-
 abs/core-testing/lirc-utils/lirc.logrotate | 3 +++
 2 files changed, 4 insertions(+), 1 deletion(-)

diff --git a/abs/core-testing/lirc-utils/PKGBUILD b/abs/core-testing/lirc-utils/PKGBUILD
index afcfb81..c4d5759 100644
--- a/abs/core-testing/lirc-utils/PKGBUILD
+++ b/abs/core-testing/lirc-utils/PKGBUILD
@@ -3,7 +3,7 @@
 
 pkgname=lirc-utils
 pkgver=0.8.5CVS
-pkgrel=6
+pkgrel=7
 pkgdesc="Linux Infrared Remote Control utils"
 arch=(i686 x86_64)
 url="http://www.lirc.org/"
diff --git a/abs/core-testing/lirc-utils/lirc.logrotate b/abs/core-testing/lirc-utils/lirc.logrotate
index 623c4f3..df97c60 100644
--- a/abs/core-testing/lirc-utils/lirc.logrotate
+++ b/abs/core-testing/lirc-utils/lirc.logrotate
@@ -2,4 +2,7 @@
    missingok
    notifempty
    delaycompress
+   postrotate
+      /usr/bin/killall -HUP -q lircd
+   endscript
 }
-- 
cgit v0.12

