From af3f2dc08bde2ccd9ffb671235e2f02b3e571226 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Thu, 19 Feb 2009 13:06:13 -0600
Subject: recompiled to link to the latest version of libraw1394

---
 abs/core-testing/libavc1394/PKGBUILD  | 2 +-
 abs/core-testing/libdc1394/PKGBUILD   | 2 +-
 abs/core-testing/libiec61883/PKGBUILD | 2 +-
 3 files changed, 3 insertions(+), 3 deletions(-)

diff --git a/abs/core-testing/libavc1394/PKGBUILD b/abs/core-testing/libavc1394/PKGBUILD
index 8138916..23aa5cc 100644
--- a/abs/core-testing/libavc1394/PKGBUILD
+++ b/abs/core-testing/libavc1394/PKGBUILD
@@ -4,7 +4,7 @@
 
 pkgname=libavc1394
 pkgver=0.5.3
-pkgrel=1
+pkgrel=2
 pkgdesc="A library to control A/V devices using the 1394ta AV/C commands."
 arch=("i686" "x86_64")
 url="http://sourceforge.net/projects/libavc1394/"
diff --git a/abs/core-testing/libdc1394/PKGBUILD b/abs/core-testing/libdc1394/PKGBUILD
index 75f3704..90ad87b 100644
--- a/abs/core-testing/libdc1394/PKGBUILD
+++ b/abs/core-testing/libdc1394/PKGBUILD
@@ -3,7 +3,7 @@
 
 pkgname=libdc1394
 pkgver=2.1.0
-pkgrel=1
+pkgrel=2
 pkgdesc="High level programming interface to control IEEE 1394 based cameras"
 arch=(i686 x86_64)
 license=('LGPL')
diff --git a/abs/core-testing/libiec61883/PKGBUILD b/abs/core-testing/libiec61883/PKGBUILD
index 6c11122..8159d36 100644
--- a/abs/core-testing/libiec61883/PKGBUILD
+++ b/abs/core-testing/libiec61883/PKGBUILD
@@ -5,7 +5,7 @@
 
 pkgname=libiec61883
 pkgver=1.2.0
-pkgrel=1
+pkgrel=2
 pkgdesc="A higher level API for streaming DV, MPEG-2 and audio over Linux IEEE 1394"
 arch=('i686' 'x86_64')
 url="http://www.linux1394.org/"
-- 
cgit v0.12

